0

500 1000

2000

3000

4000

5000

6000

8000

10000

12000

16000

20000

24000

28000

32000

36000

40000

44000

48000

52000

56000

60000

64000

68000

72000

100

A=54

NDS 50, 255(1987) NDS 68, 887(1993)(U) (Revised 1995)

Evaluator: Junde Huo

54 19K

Q_{β−}(18000)

10 ms β−

(1700) Sn

(18700) Sp

54 20Ca

Q_{β−}(10900)

0+ β−

(3800) Sn n

(18900) Sp

54 21Sc

Q_{β−}11300

(4600) Sn

(13900) Sp

54 22Ti

Q_{β−}4120

0+

7010 Sn

(15100) Sp

54 23V

Q_{β−}7042

3+ 49.8 s β−

6113 Sn

10350 Sp

54 24Cr 0+

9719.01 Sn 12373 Sp

54 25Mn

Q_{β−}697.1

3+ 312.3 d

Q_{EC}1377.1

EC

7559.6 Sp 8939.0 Sn

54 26Fe 0+

8853.8 Sp

13378.5 Sn

54 27Co

Q_{EC}8243.08

0 0+ 193.23 ms EC

199 (7)+ 1.48 m EC 4353.0 Sp

13438 Sn

54 28Ni

Q_{EC}8800

0+ EC

3860 Sp

(17900) Sn 54 29Cu

Q_{EC}(17510) Q_p(400)

(16300) Sn 54 30Zn

Q_{EC}(15100)

0+ (400) Sp