Survey Number: PM-002  
Format Acronymn: ARO8
NGDC File Number: 0140-002
Params: FXD  
Data Rec'd @NGDC (YYMMDD): 850000
Contributing Institution:                                         
Country:                   
Platform Name:                     
Code:  
Platform Type:       
Chief Scientist(s):                                
Project:                                                                               
Start Date (YYMMDD): 551017
Survey Departure Airport:                                  
End Date (YYMMDD): 690802
Survey Arrival Airport:                                
Flight Line Spacings:                                         
Magnetometor(s) Used:                                       
Aircraft Altitude:                     
Aircraft Velocity:               
Sampling Rates Per Second:    
Sensor Tow Distance:        
Reference Field:              
Total Observations:           
Magnetometor Sensitivity:            
Bounding Limits:
Top Latitude   : +89
Bottom Latitude: +45
Left Longitude : -148
Right Longitude: +023
                                                                             
                                                                              
                                                                              
                                                                              
                                                                              
                                                                              
                                                                              
                                                                              
