0

500 1000

2000

3000

4000

5000

6000

8000

10000

12000

16000

20000

24000

28000

32000

36000

40000

44000

48000

52000

56000

60000

100

A=42

NP A521, 1(1990)

Evaluator: P.M. Endt

42 14Si

Q_{β−}(14900)

0+ (4900) Sn

42 15P

Q_{β−}(17300)

110 ms β−

(3100) Sn

(19000) Sp

42 16S

Q_{β−}7700

0+ 0.56 s β−

6700 Sn n 50%

19700 Sp

42 17Cl

Q_{β−}9430

6.8 s β−

5720 Sn n <4%

13670 Sp

42 18Ar

Q_{β−}600

0+ 32.9 y β−

9430 Sn

14370 Sp

42 19K

Q_{β−}3525.4

2^– 12.360 h β−

7533.77 Sn 9243.0 Sp

42 20Ca 0+

10276.9 Sp 11480.60 Sn

42 21Sc

Q_{EC}6425.84

0 0+ 681.3 ms EC

616.28

7+,(5+,6+) 61.7 s EC

4272.41 Sp

11550.0 Sn

42 22Ti

Q_{EC}7000

0+ 199 ms EC

3768 Sp

(17480) Sn 42 23V

Q_{EC}(16950) Q_p(260)

(16000) Sn 42 24Cr

Q_{EC}(14200)

0+ (1100) Sp