IMGDISPCP -- Displays NASA-Langley cloud products, map and color bar
  IMGDISPCP dataset frame <keywords>
Parameters:
  dataset - ADDE dataset name, must be specified as A.xxxx or group/descriptor
  frame   - frame number to display image (def=current)
Keywords:
  DAY=   | image date yyyy/mm/dd
  TIME=  | image time hh:mm
  BAND=  | Band number(s) to display. Can be more than one (1 3 7 11 14 15)
  NCOLORS= | number of colors for the colorbar (4-12)
  ORIENT=HOR | colorbar is display horizontally
        =VER | colorbar is display vertically
  POS=lin ele thickness length | location, thickness and length of colorbar
  TITLE=YES | calibration block name and units used for colorbar title (def)
       =YES CTL CTU | override cal block with user-input label and units
            CTL=1-4 char label  CTU=1-6 char unit
       =NO  | no title for colorbar
  LSIZE=  | label size for colorbar
  LCOLOR= | color of labels
  LABFORM= | format of colorbar labels, INT or REAL
  RANGE=min max | range of values for colorbar
  LABELS= | colorbar labels; Enter list of numbers from 1...NCOLORS+1
  TLABELS= | text format colorbar labels; Currently works for 4-9 colors
             Example: TLABELS=CLD CLR SNO ICE OCN LAND UND HAZ
             Use the "&" character for blank space (ICE&CLD)
             Use the -99 character for a blank label
  BCOLORS= | McIDAS colors to use for colorbars with text (phase, icing)
             EU COLORS shows the colors to enter
  BFONT= | font style for bar labels.
  MAG= | image magnification factor
  LATLON= | center Lat and Lon of product image to be displayed
  MAPCOL= | map color
  MAPLIN= | line range to plot map
  MAPELE= | element range to plot map
  BLACK=YES | plot black border around colorbar (def),
       =NO  | no border around colorbar
  GRAY=YES  | Gray box for Re/De, LWP/IWP at end of colorbar (def)
      =NO   | No gray box
  QC=YES BOT | Turn quality control on, put tag colors on the bar bottom. (def)
  QC=YES TOP | Turn quality control on, put tag colors on the bar top.
               No-Retrieval/Solution = Pink (cloud products)
               Outside Valid Range = Brown (all products except icing, phase)
    =NO      | Do not do quality control, 2 above categories will be black.
  ICEFILL=YES | Icing no data = white (same as INDETER) (def)
         =NO  | Icing no data = green (No Retrieval/Solution, Bad Data)
  EXTRAN=NO  | Leave values beyond high and low end of color
               bar red and purple. (def)
        =YES | Make extreme high and low values white
               (ref=1.2, emit=1.05, LWP=5000, etc.)
  ZLM=YES | Block out part of the image with graphics overlay: (def=NO),
            color, #lines, #eles, middle lin, middle ele.
  REPEAT= Displays more than one image at a time.
  MIXP = NO YES  Displays polar cloud phase for MODIS (def=NO)
  SNOWICE=NO YES Displays clear-sky snow/ice on the phase image (def=YES)
Remarks:
  Most keywords are preset to display the product images by default.
  Only the BAND=keyword is required.
Examples:
  IMGDISPCP A.1000 2 LATLON=37 80 BAND=8 MAG=-1
  IMGDISPCP A.1000 1 LATLON=40 83 BAND=16 NCOLORS=9 ORIENT=HOR REPAT=1
            LABELS=100 300 500 600 700 800 850 900 950 1000 LSIZE=8 LCOLOR=3 MAG=-1
  IMGDISPCP A.1000 1 LATLON=40 83 BAND=14 NCOLORS=8 ORIENT=VER
            RANGE=200 1000 LSIZE=8 LCOLOR=3 LATLON=40 83 MAG=-1 REPEAT=1 QC=NO
----------
