W Nev 2008 5-Hz SA w/2%PE50YR

120˚ 30'W

120˚ 00'W 119˚ 30'W

119˚ 00'W 118˚ 30'W

38˚ 30'N

39˚ 00'N

39˚ 30'N

40˚ 00'N

GMT Apr 4 14:11 SA for Western Nevada. Site Vs30 760ms. 5 Hz 2%50 yr PE.

0 10 20 km

0.50

0.56

0.62

0.69

0.77

0.85

0.95

1.06

1.18

1.31

1.46

1.63

1.81

2.02

2.25

2.505HzSAg