Figure 27. Thermoelectric power water withdrawals (fresh, saline) by State,

EXPLANATION Water withdrawals, in million gallons per day 0 - 2,000 2,000 - 4,000 4,000 - 6,000 6,000 - 9,000 9,000 - 15,500