 Run 63418 Event 3053   R63418_E3053.PAD               24OCT94  4:05:34 26-OCT-94

                                                                      PHI:

                                                                      ETA:

                                                                              234.

                                                                             -0.75

                                                                            312.2

                               DAIS E transverse Eta-Phi LEGO Plot
                               Max tower E= 312.2 Min tower E=  0.50  N clusters=

                                  METS: Etotal =1381.8 GeV,   Et(scalar)= 670.3 Ge
                                        Et(miss)=  66.0 at Phi= 243.9 Deg.

                                                                                           Run 63418 Event 3053   R63418_E3053.PAD               24OCT94  4:05:34 26-OCT-94

PHI:

ETA:

   61.

  0.61

                                                                                                           *  EAST Wedge  4 Max Tower =   359.2394 GeV  *
                                                                                                      * CEMD * AMP x16, x1 LEFT  towers 0 - 9
                                                                                                        0     0     0     0 18729 65535  4792     0     0     0
                                                                                                        0     0     0     0  2108 65534  1237     0     0     0
                                                                                                      * CEMD * AMP x16, x1 RIGHT towers 0 - 9
                                                                                                        0     0     0     0 16858 65535  3847     0     0     0
                                                                                                        0     0     0     0  1991 55314  1177     0     0     0
                                                                                                      * CHAD * AMP x16, x1 LEFT  towers 0 - 7
                                                                                                        0     0     0  1415 16937 37636  1671     0
                                                                                                        0     0     0  1025  1996  3289  1041     0
                                                                                                      * CHAD * AMP x16, x1 RIGHT towers 0 - 7
                                                                                                        0     0     0     0 26232 36316  1207     0
                                                                                                        0     0     0     0  2577  3207  1012     0
                                                                                                        0     0     0     0     0     0     0     0 CHA TDC

                                                                                               Min and Max(Channel =  72) Str GeV  0.000 39.828
                                                                                               Min and Max(Channel =  44) Wir GeV  0.000 49.278
                                                                                               Min and Max(Channel =  23) Pre fC     0.00  3285.69(=   6 MIPS)

 Run 63418 Event 3053   R63418_E3053.PAD               24OCT94  4:05:34 26-OCT-94

                                                                      PHI:

                                                                      ETA:

                                                                               61.

                                                                              0.61

 Wedge #s  3 -   5

 Wedge #s 15 -  17

                                                                  Emax =359.6 Gev.

 Ewedge =

  375.1 Gev.

                                                     Primary vertex #1 z= 31.98

                                                                                           Run 63418 Event 3053   R63418_E3053.PAD               24OCT94  4:05:34 26-OCT-94

                                                                                            Pt   Phi   Eta
                                                                                          z_1= 32.0, 43 trks
                                                                                           312.7  66  0.50 E
                                                                                             8.4 277 -1.08 E
                                                                                           -49.8  234 -0.75
                                                                                           -14.4  241 -0.95
                                                                                            13.5  260 -0.76
                                                                                           -12.1  232 -0.84
                                                                                           -11.0  262  0.07
                                                                                             8.8  231 -0.81
                                                                                            -8.5  231 -0.91
                                                                                             8.3  253 -0.69
                                                                                            -7.8  232 -0.80
                                                                                            -5.6  256 -0.83
                                                                                            -4.9  248 -0.79
                                                                                             4.5  260 -0.75
                                                                                            -4.5  261 -0.87
                                                                                            -4.4  265 -1.00
                                                                                             4.0  272 -1.01
                                                                                             3.6  265 -0.93
                                                                                             3.4  243 -0.67
                                                                                             3.2  239 -0.77
                                                                                            -2.9  279 -1.08
                                                                                            -2.6  272 -1.06
                                                                                             1.5  272 -0.84
                                                                                             1.3  280 -0.70
                                                                                            -1.2  264 -0.69
                                                                                             1.2  253 -0.84
                                                                                            -1.0  235 -1.16
                                                                                          z_2=-31.7,  9 trks
                                                                                          z_3= -9.3,  4 trks
                                                                                          z_4= 40.9,  5 trks
                                                                                          z_6=-42.1,  1 trks
                                                                                            6 unattchd trks

                                                                                           43 more trks...
                                                                                           hit & to display PHI:

ETA:

  234.

 -0.75

 Emax =  374.8 GeV

NO CTCD or CTCE

                                                                                                             Et(METS)=  66.0 GeV

                                                                                                             /
                                                                                                                 Phi = 243.9 Deg
                                                                                                              Sum Et = 670.3 GeV