ObjectMon #2 TimeMonitor HADTDC Timing

Run:185545 Event: 1684786 # of Events:11955 Time: Mon Jul 26 11:50:44 2004 Ref.Run:185201

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 92720

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

Entries 101639 Mean 564.4 RMS 7.186

CHA: Raw Time /ndf= 2.1 (<17) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

Entries 101639 Mean 55.56 RMS 2.538

CHA: Hit Width

/ndf= 26 (>17) 2χ BAD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 65635

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570

Events

0 1000

2000

3000

4000

5000

Entries 80733 Mean 559.5 RMS 6.28

PHA: Raw Time /ndf= 5.4 (<17) 2χ GOOD

Width [ns]

50 55 60 65

Events

0 2000

4000

6000

8000

10000

12000

Entries 80733 Mean 57.13 RMS 2.844

PHA: Hit Width

/ndf= 3.7 (<17) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 30425 Mean 1.687 RMS 0.763

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

1600

Entries 34603 Mean 562.3 RMS 8.147

WHA: Raw Time /ndf= 1.1 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 500 1000

1500

2000

2500

3000

3500

4000

4500

RawWidthWHA Entries 34603 Mean 54.46 RMS 2.668

WHA: Hit Width /ndf= 10 (<15) 2χ GOOD