Numtra=12
Ntrak =19
Nssdv = 4
Mssdv = 3

                       33322222222211111111111
                       21098765432109876543210987654321
                 Trig:
                 Skim:

                                                1
                              1  11         111   1   1

E unavail γ

Run: 2961, Spill:   82, Event:   324

                         Page:     3
                         Ev :    16

File: VM40B2DKA300:Ε687BRIGITTE_90.DAT;1

25-JAN-95 18:14:55

Microrico Mic-Trk-Cer 1 - 2 11 2 + 3 8 14 + 4 3 0 + 5 5 4 + 6 4 12 - 7 1 3 - 8 9 12 + 9 - 10 - 11 7 14 - 12 2 3 -

Track1 Trk-Mic-Cer

1 7 3 - 2 12 3 - 3 4 0 + 4 6 12 - 5 5 4 + 6 - 1 + 7 11 14 - 8 3 14 + 9 8 12 + 10 - 0 - 11 2 2 + 12 - 1 - 13 - 15 + 14 - 15 - 15 - 3 - 16 - 0 - 17 - 0 - 18 - 0 - 19 - 15 +

M1 M2

Omux

Omuy

OmuH

OmuV

HxV

C1 C2 C3 OE

IE

HC

Chc Bgm

Mu filter 1

Mu filter 2

Imu1x

Imu1y

Imu1v

Imu1h

Imu2x

Imu2y

Imu2h

P0

P1 P2

P3

P4

-1000. -500. 0. 500. 1000. 1500.

-260.

-240.

-220.

-200.

-180.

-160.

Spectrometer frame

bend projection

D^0 5 K^-π^+ candidate Massϑ 1.836Α0.015 GeV L/σ = 23.95 D/σ = 2.66 Trk pointers: 6 2

D^0 5 K^+π^+π^-π^- candidate Massϑ 1.868Α0.006 GeV L/σ = 45.58 D/σ = 1.87 Trk pointers: 5 7 12 4