DV Plateau

Voltage UH&DV&DHUH&DH 1400 353 544 0.649 1500 512 716 0.715 1540 840 1092 0.769 1560 1434 1727 0.830 1580 1732 1968 0.880 1600 1342 1471 0.912 1620 1352 1512 0.894 1640 992 1095 0.906 1660 1417 1590 0.891 1680 1086 1261 0.861 1700 1032 1231 0.838 1720 1004 1261 0.796 1740 1036 1419 0.730 1760 1068 1713 0.623 1780 2207 4112 0.537 1800 1180 2730 0.432 1850 1156 4823 0.240