ObjectMon #2 TimeMonitor HADTDC Timing

Run:179580 Event: 236434 # of Events:36769 Time: Wed Mar 3 10:53:15 2004 Ref.Run:179505

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 213568

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

Entries 228218 Mean 567.7 RMS 7.217

CHA: Raw Time

/ndf=2.7e+02 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 5000

10000

15000

20000

25000

30000

35000

Entries 228218 Mean 55.47 RMS 2.546

CHA: Hit Width

/ndf= 7.4 (<15) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 310173

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570

Events

0 5000

10000

15000

20000

25000

Entries 402529 Mean 561.1 RMS 5.901

PHA: Raw Time /ndf= 55 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 10000

20000

30000

40000

50000

60000

Entries 402529 Mean 57.02 RMS 2.598

PHA: Hit Width

/ndf= 8.5 (<15) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 91065 Mean 1.681 RMS 0.7652

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

Entries 102185 Mean 564.7 RMS 7.663

WHA: Raw Time /ndf= 36 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

RawWidthWHA Entries 102185 Mean 54.16 RMS 2.848

WHA: Hit Width /ndf= 25 (>15) 2χ BAD