ObjectMon #2 TimeMonitor HADTDC Timing

Run:160896 Event: 424207 # of Events:14131 Time: Thu Apr 3 09:17:36 2003

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffCHA

Entries 83353 Mean 1.64 RMS 0.7857

CHA: Eff. KS=0.97 (>0.01) GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

Entries 92131 Mean 567.9 RMS 6.921

CHA: Raw Time /ndf= 3.1 (<15) 2χ GOOD

Nent = 92131 0.03 ± Mean = 568 0.02 ± RMS = 6.6

Width [ns]

50 52 54 56 58 60 62

Events

0 2000

4000

6000

8000

10000

12000

14000

Entries 92131 Mean 55.59 RMS 2.323

CHA: Hit Width

/ndf= 1.4 (<15) 2χ GOOD

Nent = 55026 0.01 ± Mean = 56 0.009 ± RMS = 2.2

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffPHA75

Entries 79121 Mean 5.614 RMS 2.553

PHA: Eff.

KS=0.0014 (<0.01) BAD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

Entries 102182 Mean 561.7 RMS 6.798

PHA: Raw Time /ndf= 4.3 (<15) 2χ GOOD

Nent = 102182 0.02 ± Mean = 562 0.02 ± RMS = 6.7

Width [ns]

50 55 60 65

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

Entries 102182 Mean 57.24 RMS 2.802

PHA: Hit Width

/ndf= 1.6 (<15) 2χ GOOD

Nent = 25720 0.02 ± Mean = 57 0.02 ± RMS = 2.5

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 27694 Mean 1.658 RMS 0.7762

WHA: Eff. KS= 1 (>0.01)

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

1600

Entries 32448 Mean 565.3 RMS 7.599

WHA: Raw Time /ndf= 1.5 (<15) 2χ GOOD

Nent = 32448 0.05 ± Mean = 565 0.04 ± RMS = 7.3

Width [ns]

50 55 60

Events

0 500 1000

1500

2000

2500

3000

3500

4000

4500

Entries 32448 Mean 54.34 RMS 2.933

WHA: Hit Width

/ndf= 3.5 (<15) 2χ GOOD

Nent = 32448 0.02 ± Mean = 54 0.01 ± RMS = 2.7