NCEP Wind Stress, Jun 2007

1 dyne cm^{-2}

45^oW 40^oW 35^oW 30^oW 25^oW

28^oS

26^oS

24^oS

22^oS

20^oS

18^oS

16^oS

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2