Status of Monte Carlo Samples for IPT Studies

Nov. 26, 1996 ( Located in DAFM04$DKA300:[PRJ350.VTX TRIG1.MC] )

New ”Policy”

1. Generator level files will stay in subdirectory [.4VEC] until they are GEANTed. 2. Files deleted from [.4VEC] area will be backed up to tape. 3. GEANT level files will stay in subdirectory [.DATA] until ... ? 4. D0 upgrade naming convention will be followed.

Generator Level (in subdirectory [.4VEC])

• pp̄ → tt̄ (all decay channels) UPG TT170ALL1 IS714 A.ISA - 10,000 events UPG TT170ALL3 IS714 A.ISA - 500 events UPG TT170ALL5 IS714 A.ISA - 300 events UPG TT170ALL5 IS714 B.ISA - 300 events

GEANT Level (in subdirectory [.DATA]) • pp̄ → bb̄ → B + X → J/Ψ + K_s, where J/Ψ → μ+μ� and K_s → π+π� UPG BBPSIKSA0 IS714 A.GEN - 1,205 events UPG BBPSIKSX0 IS714 A.GEN - 165 events (2μ;p^μ_T >1.5GeV; |η^μ| <1) UPG BBPSIKSX1 IS714 A.GEN - 77 events (2μ;p^μ_T >1.5GeV; |η^μ| <1) UPG BBPSIKSX3 IS714 A.GEN - 165 events (2μ;p^μ_T >1.5GeV; |η^μ| <1) UPG BBPSIKSX5 IS714 A.GEN - 165 events (2μ;p^μ_T >1.5GeV; |η^μ| <1) • pp̄ → tb̄ + X or pp̄ → tq + X or pp̄ → tb̄q, where W → μ UPG ST180QTB0 PY560 A.GEN - 3,305 events UPG ST180XQT0 PY560 A.GEN - 10,000 events UPG ST180XTB0 PY560 A.GEN - 9,500 events UPG ST180XTB1 PY560 A.GEN - 1,979 events UPG ST180XTB3 PY560 A.GEN - 1,324 events UPG ST180XTB5 PY560 A.GEN - 114 events UPG ST180XTB5 PY560 B.GEN - 184 events UPG ST180XTB5 PY560 C.GEN - 38 events • pp̄ → tt̄ (all decay channels) UPG TT170ALL0 IS714 A.GEN - 550 events UPG TT170ALL0 IS714 B.GEN - 2,740 events UPG TT170ALL0 IS714 C.GEN - 695 events UPG TT170ALL1 IS714 A.GEN - 336 events UPG TT170ALL3 IS714 A.GEN - 447 events UPG TT170ALL5 IS714 A.GEN - 250 events UPG TT170ALL5 IS714 B.GEN - 46 events

Reconstruction Level (in subdirectory [.RECO])

• None so far...