ObjectMon #112 SVXMonitor SVX Slide Show

Run:267718 Event: 4957974 # of Events:79130 Time: Sun Oct 5 04:53:51 2008 Ref.Run:262196

ϕ track

0 1 2 3 4 5 6

0d

-0.1

-0.05 0 0.05 0.1

1

10

210 scatter plot ϕ vs. 0 Track d

ϕ track

0 1 2 3 4 5 6

0 average d

-0.003

-0.002

-0.001 0 0.001

0.002

0.003

amplitude=9.4e-05 (<0.005)

<0.02)

0 (d ϕ vs. 0 Average d

d -0.1 -0.05 0 0.05 0.1 10 210 310

Entries 123366 Mean -4.469e-05 RMS 0.01673

= 5.9 (> 5) 2χ 0 Track d

number of hits

0 5 10 15 0 10000

20000

30000

40000

Entries 105063 Mean 4.254 RMS 0.8484

= 12 (> 5) 2χ <0.02) 0 # of Silicon Hits (d

2χ 0 20 40 60 80 0 500 1000

1500

2000

2500

3000

Entries 101568 Mean 18.97 RMS 13.51

= 2.9 (< 5) 2χ <0.02)

0 (d^2χ

Track

wedge number

0 20 40 60

efficiency

0 0.2 0.4 0.6 0.8 1 Entries 122626

=0.043 (< 5) 2χ Efficiency by wedge