ObjectMon #2 TimeMonitor HADTDC Timing

Run:181463 Event: 5057010 # of Events:37605 Time: Fri Apr 9 21:30:04 2004 Ref.Run:181078

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 306516

CHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

Entries 334528 Mean 565.1 RMS 7.167

CHA: Raw Time /ndf= 3.2 (<22) 2χ GOOD

Width [ns]

50 55 60

Events

0 10000

20000

30000

40000

50000

Entries 334528 Mean 55.76 RMS 2.57

CHA: Hit Width

/ndf= 4.1 (<22) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 242600

PHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

Entries 307032 Mean 560 RMS 6.13

PHA: Raw Time /ndf= 5.3 (<21) 2χ GOOD

Width [ns]

50 55 60 65

Events

0 10000

20000

30000

40000

50000

Entries 307032 Mean 57.23 RMS 2.836

PHA: Hit Width

/ndf= 2.2 (<21) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 101566 Mean 1.684 RMS 0.7635

WHA: Eff. Eff. Check Ok GOOD

raw time [ns]

540 550 560 570 580

Events

0 1000

2000

3000

4000

5000

Entries 117727 Mean 562.8 RMS 8.041

WHA: Raw Time /ndf= 2.2 (<17) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

RawWidthWHA Entries 117727 Mean 54.49 RMS 2.931

WHA: Hit Width /ndf= 2 (<17) 2χ GOOD