PvmDataRaw PvmDataInPlace pvm_psend mpc_bsend PVMe InPlace (Int) PVMe InPlace (NoInt)

0 100 200 300 400 500 600 700 800 900 1000 0

1

2

3

4

5 x 10^{-4}

Number of bytes sent

Time in seconds

IBM SP2