+ + III. History & Description of the Apparatus

1. Location in Phase Space (See Figure)

2. Location in Space (See Figure)

3. Location in Time (See Figure)

+ 1

4. The Apparatus(Downstream):

(a) 24 MWPC Planes 30 cm x 30 cm, 24 x 128 = 3072 wires

(b) Movable Pb Converter After 8th MWPC Pb: 1X0, 0.5X0, 2X0; Fe: 1X0

(c) 28-Module, Pb-Scintillator

EM Calorimeter After the MWPC’s

(d) 7-Channel, Trigger Scintillator

within MWPC Telescope

(e) Two VAX 3100’s for DAQ

5. The Apparatus(Upstream):

(a) 8-Channel Scintillator Hodoscope Upstream for Beam-Beam Trigger (p̄ Counters)

(b) Upstream Counters:

ffl Two 10 cm x 10 cm x 100 kg Hadron

Calorimeter Modules 25m Upstream for Leading-p̄

(xF ’ 0.5)

and Leading-n̄

ffl 4 Scintillators Set Against

the Beampipe 60 m Upstream for Leading-p̄ (xF ’ 0.9) Tags