CFT Summary (All Clusters)

2 4 6 8 10 12 14 16 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

Layer Occupancy

0 20 40 60 80 100 120 140 160 0

0.02

0.04

0.06

0.08

0.1 Occupancy vs tick

2 4 6 8 10 12 14 16 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 Singlet to Doublet rate^{Entries 16}

Mean 8.931 RMS 4.606

Singlet to Doublet rate

2 4 6 8 10 12 14 16 0 5 10 15 20 25 Dead channels^{Entries 164}

Mean 9.165 RMS 4.309

Dead channels

2 4 6 8 10 12 14 16 0 5 10 15 20 25 30 Suspect channels^{Entries 190}

Mean 10.66 RMS 4.102

Suspect channels

2 4 6 8 10 12 14 16 0 1 2 3 4 5 6 7 8 Hot channels^{Entries 25}

Mean 8.96 RMS 4.045

Hot channels

Cft Hit Fiber (All Clusters)

0 200 400 600 800 1000 1200 0 1000

2000

3000

4000

5000

6000

7000

CFTX1 Hit Fiber^{Entries 1.256544e+07}Mean 632_{RMS 368.8}

CFTX1 Hit Fiber

0 200 400 600 800 1000 1200 0 1000

2000

3000

4000

5000

6000

CFTU1 Hit Fiber^{Entries 1.168861e+07}Mean 631.2_{RMS 366.8}

CFTU1 Hit Fiber

0 200 400 600 8001000120014001600 0 500 1000

1500

2000

2500

3000

3500

4000

CFTX2 Hit Fiber^{Entries 1.177831e+07}Mean 794.8_{RMS 463.2}

CFTX2 Hit Fiber

0 200 400 600 8001000120014001600 0 500 1000

1500

2000

2500

3000

3500

4000

CFTV1 Hit Fiber^{Entries 1.098858e+07}Mean 784.9_{RMS 458.9}

CFTV1 Hit Fiber

0 20040060080010001200140016001800 0 1000

2000

3000

4000

5000

6000

CFTX3 Hit Fiber^{Entries 1.546249e+07}Mean 959.8_{RMS 552.7}

CFTX3 Hit Fiber

0 20040060080010001200140016001800 0 500 1000

1500

2000

2500

3000

3500

4000

CFTU2 Hit Fiber^{Entries 1.464968e+07}Mean 945.4_{RMS 557.1}

CFTU2 Hit Fiber

0 2004006008001000120014001600180020002200 0 2000

4000

6000

8000

10000

12000

CFTX4 Hit Fiber^{Entries 1.459488e+07}Mean 1110_{RMS 647.2}

CFTX4 Hit Fiber

0 2004006008001000120014001600180020002200 0 2000

4000

6000

8000

10000

12000

CFTV2 Hit Fiber^{Entries 1.380611e+07}Mean 1103_{RMS 643.1}

CFTV2 Hit Fiber

0 500 1000 1500 2000 2500 0 500 1000

1500

2000

2500

3000

CFTX5 Hit Fiber^{Entries 1.350715e+07}Mean 1271_{RMS 736.1}

CFTX5 Hit Fiber

0 500 1000 1500 2000 2500 0 500 1000

1500

2000

2500

3000

CFTU3 Hit Fiber^{Entries 1.289394e+07}Mean 1252_{RMS 741.1}

CFTU3 Hit Fiber

0 500 1000 1500 2000 2500 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

CFTX6 Hit Fiber^{Entries 1.250382e+07}Mean 1427_{RMS 836.6}

CFTX6 Hit Fiber

0 500 1000 1500 2000 2500 0 10000

20000

30000

40000

50000

60000

CFTV3 Hit Fiber^{Entries 1.165977e+07}Mean 1416_{RMS 827.8}

CFTV3 Hit Fiber

0 500 1000 1500 2000 2500 3000 0 500 1000

1500

2000

2500

CFTX7 Hit Fiber^{Entries 1.153339e+07Mean 1585}_{RMS 918.4}

CFTX7 Hit Fiber

0 500 1000 1500 2000 2500 3000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

CFTU4 Hit Fiber^{Entries 1.07606e+07Mean 1553}_{RMS 926.9}

CFTU4 Hit Fiber

0 500 100015002000250030003500 0 500 1000

1500

2000

2500

3000

CFTX8 Hit Fiber^{Entries 1.204048e+07Mean 1745}_{RMS 1016}

CFTX8 Hit Fiber

0 500 100015002000250030003500 0 500 1000

1500

2000

2500

3000

CFTV4 Hit Fiber^{Entries 1.129107e+07Mean 1734}_{RMS 1019}

CFTV4 Hit Fiber

Cft ADC (all) (All Clusters)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500 2 x10CFTX1 ADC (all)

Entries 1.256544e+07 Mean 143.8 RMS 52.89

CFTX1 ADC (all)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

2 x10CFTU1 ADC (all)

Entries 1.168861e+07 Mean 117.6 RMS 56.09

CFTU1 ADC (all)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000 2 x10CFTX2 ADC (all)

Entries 1.177831e+07 Mean 143.6 RMS 52.48

CFTX2 ADC (all)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400 2 x10CFTV1 ADC (all)

Entries 1.098858e+07 Mean 121.3 RMS 55.67

CFTV1 ADC (all)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

2 x10CFTX3 ADC (all)

Entries 1.546249e+07 Mean 141.9 RMS 53.36

CFTX3 ADC (all)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500 2 x10CFTU2 ADC (all)

Entries 1.464968e+07 Mean 121.1 RMS 55.83

CFTU2 ADC (all)

0 50 100 150 200 250 300 0

1000

2000

3000

4000

5000 2 x10CFTX4 ADC (all)

Entries 1.459488e+07 Mean 138.3 RMS 53.64

CFTX4 ADC (all)

0 50 100 150 200 250 300 0

500

1000

1500

2000

2500 2 x10CFTV2 ADC (all)

Entries 1.380611e+07 Mean 118.5 RMS 55.56

CFTV2 ADC (all)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500 2 x10CFTX5 ADC (all)

Entries 1.350715e+07 Mean 138 RMS 53.87

CFTX5 ADC (all)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

2 x10CFTU3 ADC (all)

Entries 1.289394e+07 Mean 120.6 RMS 55.05

CFTU3 ADC (all)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000 2 x10CFTX6 ADC (all)

Entries 1.250382e+07 Mean 137.5 RMS 53.88

CFTX6 ADC (all)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200 2 x10CFTV3 ADC (all)

Entries 1.165977e+07 Mean 116.7 RMS 54.36

CFTV3 ADC (all)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

2 x10CFTX7 ADC (all)

Entries 1.153339e+07 Mean 132.5 RMS 53.33

CFTX7 ADC (all)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600 2 x10CFTU4 ADC (all)

Entries 1.07606e+07 Mean 110.6 RMS 53.77

CFTU4 ADC (all)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500 2 x10CFTX8 ADC (all)

Entries 1.204048e+07 Mean 134 RMS 53.71

CFTX8 ADC (all)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800 2 x10CFTV4 ADC (all)

Entries 1.129107e+07 Mean 110.7 RMS 53.39

CFTV4 ADC (all)

Cft ADC (singlet) (All Clusters)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10CFTX1 ADC (singlet)

Entries 3939192 Mean 133.5 RMS 55.66

CFTX1 ADC (singlet)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

CFTU1 ADC (singlet)^{Entries 3885723}Mean 107.5_{RMS 55.56}

CFTU1 ADC (singlet)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

1 x10CFTX2 ADC (singlet)

Entries 3829899 Mean 132.9 RMS 55.74

CFTX2 ADC (singlet)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTV1 ADC (singlet)^{Entries 3725194}Mean 112_{RMS 55.76}

CFTV1 ADC (singlet)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400 2 x10CFTX3 ADC (singlet)

Entries 5138829 Mean 130.7 RMS 56.06

CFTX3 ADC (singlet)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTU2 ADC (singlet)^{Entries 4954494}Mean 110.8_{RMS 55.82}

CFTU2 ADC (singlet)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400 2 x10CFTX4 ADC (singlet)

Entries 5057699 Mean 127.2 RMS 56.4

CFTX4 ADC (singlet)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

CFTV2 ADC (singlet)^{Entries 4898112}Mean 109.1_{RMS 55.6}

CFTV2 ADC (singlet)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400 2 x10CFTX5 ADC (singlet)

Entries 4949099 Mean 127.8 RMS 56.03

CFTX5 ADC (singlet)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTU3 ADC (singlet)^{Entries 4754835}Mean 111.8_{RMS 55.06}

CFTU3 ADC (singlet)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10CFTX6 ADC (singlet)

Entries 4936938 Mean 127.9 RMS 56.14

CFTX6 ADC (singlet)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

CFTV3 ADC (singlet)^{Entries 4768754}Mean 108.8_{RMS 54.05}

CFTV3 ADC (singlet)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10CFTX7 ADC (singlet)

Entries 4693874 Mean 123.5 RMS 54.67

CFTX7 ADC (singlet)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

CFTU4 ADC (singlet)^{Entries 4513979}Mean 102.9_{RMS 52.83}

CFTU4 ADC (singlet)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10CFTX8 ADC (singlet)

Entries 4839368 Mean 124.4 RMS 55.46

CFTX8 ADC (singlet)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTV4 ADC (singlet)^{Entries 4630257}Mean 102.9_{RMS 52.48}

CFTV4 ADC (singlet)

Cft ADC (doublet low) (All Clusters)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTX1 ADC (doublet low)^{Entries 2948025}_{Mean 127}

RMS 53.15

CFTX1 ADC (doublet low)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTU1 ADC (doublet low)^{Entries 2694440}_{Mean 99.39}

RMS 53.07

CFTU1 ADC (doublet low)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTX2 ADC (doublet low)^{Entries 2907632}_{Mean 128}

RMS 52.3

CFTX2 ADC (doublet low)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTV1 ADC (doublet low)^{Entries 2668812}_{Mean 103.2}

RMS 52.69

CFTV1 ADC (doublet low)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10CFTX3 ADC (doublet low)

Entries 3690977 Mean 126.7 RMS 52.99

CFTX3 ADC (doublet low)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

CFTU2 ADC (doublet low)^{Entries 3472113}_{Mean 103.7}

RMS 52.91

CFTU2 ADC (doublet low)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10CFTX4 ADC (doublet low)

Entries 3550261 Mean 123.5 RMS 52.58

CFTX4 ADC (doublet low)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

CFTV2 ADC (doublet low)^{Entries 3303249}_{Mean 101.1}

RMS 52

CFTV2 ADC (doublet low)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTX5 ADC (doublet low)^{Entries 3280784}_{Mean 122.5}

RMS 52.17

CFTX5 ADC (doublet low)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTU3 ADC (doublet low)^{Entries 3077953}_{Mean 103.5}

RMS 51.33

CFTU3 ADC (doublet low)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

CFTX6 ADC (doublet low)^{Entries 2979046}_{Mean 122.3}

RMS 52.04

CFTX6 ADC (doublet low)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTV3 ADC (doublet low)^{Entries 2711250}_{Mean 99.91}

RMS 50.19

CFTV3 ADC (doublet low)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

CFTX7 ADC (doublet low)^{Entries 2740332}Mean 116.7

RMS 50.8

CFTX7 ADC (doublet low)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTU4 ADC (doublet low)^{Entries 2502414}Mean 94.29

RMS 49.49

CFTU4 ADC (doublet low)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTX8 ADC (doublet low)^{Entries 2894524}Mean 118.7

RMS 51.38

CFTX8 ADC (doublet low)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTV4 ADC (doublet low)^{Entries 2676976}Mean 94.19

RMS 48.99

CFTV4 ADC (doublet low)

Cft ADC (doublet high) (All Clusters)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600 2 x10^{CFTX1 ADC (doublet high)}

Entries 2948025 Mean 168.1 RMS 38.88

CFTX1 ADC (doublet high)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10^{CFTU1 ADC (doublet high)}

Entries 2694440 Mean 142.8 RMS 48.78

CFTU1 ADC (doublet high)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400 2 x10^{CFTX2 ADC (doublet high)}

Entries 2907632 Mean 168.3 RMS 37.87

CFTX2 ADC (doublet high)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTV1 ADC (doublet high)

Entries 2668812 Mean 146.5 RMS 47.75

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800 2 x10^{CFTX3 ADC (doublet high)}

Entries 3690977 Mean 166.9 RMS 39.67

CFTX3 ADC (doublet high)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10^{CFTU2 ADC (doublet high)}

Entries 3472113 Mean 146.6 RMS 47.81

CFTU2 ADC (doublet high)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800 2 x10^{CFTX4 ADC (doublet high)}

Entries 3550261 Mean 164 RMS 40.04

CFTX4 ADC (doublet high)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTV2 ADC (doublet high)

Entries 3303249 Mean 144.3 RMS 48.05

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600 2 x10^{CFTX5 ADC (doublet high)}

Entries 3280784 Mean 164.6 RMS 40.98

CFTX5 ADC (doublet high)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10^{CFTU3 ADC (doublet high)}

Entries 3077953 Mean 146.6 RMS 47.6

CFTU3 ADC (doublet high)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400 2 x10^{CFTX6 ADC (doublet high)}

Entries 2979046 Mean 164.4 RMS 40.52

CFTX6 ADC (doublet high)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTV3 ADC (doublet high)

Entries 2711250 Mean 142.7 RMS 48.08

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10^{CFTX7 ADC (doublet high)}

Entries 2740332 Mean 159.7 RMS 41.78

CFTX7 ADC (doublet high)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTU4 ADC (doublet high)

Entries 2502414 Mean 136.1 RMS 48.84

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10^{CFTX8 ADC (doublet high)}

Entries 2894524 Mean 161.2 RMS 41.32

CFTX8 ADC (doublet high)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTV4 ADC (doublet high)

Entries 2676976 Mean 135.7 RMS 48.54

Cft ADC (doublet sum) (All Clusters)

0 100 200 300 400 500 600 0

2000

4000

6000

8000

10000 1 x10^{CFTX1 ADC (doublet sum)}

Entries 2948025 Mean 295.1 RMS 83.48

CFTX1 ADC (doublet sum)

0 100 200 300 400 500 600 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTU1 ADC (doublet sum)

Entries 2694440 Mean 242.2 RMS 93.93

0 100 200 300 400 500 600 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTX2 ADC (doublet sum)

Entries 2907632 Mean 296.3 RMS 81.88

0 100 200 300 400 500 600 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTV1 ADC (doublet sum)

Entries 2668812 Mean 249.7 RMS 92.57

0 100 200 300 400 500 600 0

2000

4000

6000

8000

10000 1 x10^{CFTX3 ADC (doublet sum)}

Entries 3690977 Mean 293.7 RMS 84.48

CFTX3 ADC (doublet sum)

0 100 200 300 400 500 600 0 10000

20000

30000

40000

50000

60000

CFTU2 ADC (doublet sum)

Entries 3472113 Mean 250.3 RMS 92.91

0 100 200 300 400 500 600 0

2000

4000

6000

8000

10000 1 x10^{CFTX4 ADC (doublet sum)}

Entries 3550261 Mean 287.5 RMS 84.47

CFTX4 ADC (doublet sum)

0 100 200 300 400 500 600 0 5000

10000

15000

20000

25000

30000

35000

40000

CFTV2 ADC (doublet sum)

Entries 3303249 Mean 245.4 RMS 92.31

0 100 200 300 400 500 600 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTX5 ADC (doublet sum)

Entries 3280784 Mean 287.1 RMS 84.91

0 100 200 300 400 500 600 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTU3 ADC (doublet sum)

Entries 3077953 Mean 250.1 RMS 91.16

0 100 200 300 400 500 600 0 10000

20000

30000

40000

50000

60000

70000

CFTX6 ADC (doublet sum)

Entries 2979046 Mean 286.7 RMS 84.26

0 100 200 300 400 500 600 0 5000

10000

15000

20000

25000

30000

35000

CFTV3 ADC (doublet sum)

Entries 2711250 Mean 242.6 RMS 90.63

0 100 200 300 400 500 600 0 10000

20000

30000

40000

50000

CFTX7 ADC (doublet sum)

Entries 2740332 Mean 276.4 RMS 84.36

0 100 200 300 400 500 600 0 5000

10000

15000

20000

25000

30000

CFTU4 ADC (doublet sum)

Entries 2502414 Mean 230.4 RMS 91.02

0 100 200 300 400 500 600 0 10000

20000

30000

40000

50000

60000

70000

CFTX8 ADC (doublet sum)

Entries 2894524 Mean 279.9 RMS 84.53

0 100 200 300 400 500 600 0 5000

10000

15000

20000

25000

30000

CFTV4 ADC (doublet sum)

Entries 2676976 Mean 229.9 RMS 90.21

Cft ADC (all sector 2) (All Clusters)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTX1 ADC (all sector 2)^{Entries 1295848}_{Mean 145.1}

RMS 51.24

CFTX1 ADC (all sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTU1 ADC (all sector 2)^{Entries 1171071}_{Mean 116.7}

RMS 55.48

CFTU1 ADC (all sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTX2 ADC (all sector 2)^{Entries 1174693}_{Mean 142.7}

RMS 51.58

CFTX2 ADC (all sector 2)

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTV1 ADC (all sector 2)^{Entries 1095479}_{Mean 115}

RMS 55.14

CFTV1 ADC (all sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTX3 ADC (all sector 2)^{Entries 1540077}_{Mean 136.3}

RMS 53.59

CFTX3 ADC (all sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTU2 ADC (all sector 2)^{Entries 1469538}_{Mean 120.5}

RMS 55.24

CFTU2 ADC (all sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTX4 ADC (all sector 2)^{Entries 1471178}_{Mean 139.4}

RMS 52.67

CFTX4 ADC (all sector 2)

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTV2 ADC (all sector 2)^{Entries 1400924}_{Mean 118.4}

RMS 55.46

CFTV2 ADC (all sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTX5 ADC (all sector 2)^{Entries 1330075}_{Mean 133.8}

RMS 54.51

CFTX5 ADC (all sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTU3 ADC (all sector 2)^{Entries 1289280}_{Mean 118.2}

RMS 53.87

CFTU3 ADC (all sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTX6 ADC (all sector 2)^{Entries 1240303}_{Mean 135.4}

RMS 53.22

CFTX6 ADC (all sector 2)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

CFTV3 ADC (all sector 2)^{Entries 1198900}_{Mean 106.4}

RMS 54.27

CFTV3 ADC (all sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

CFTX7 ADC (all sector 2)^{Entries 1190314}Mean 134

RMS 53.53

CFTX7 ADC (all sector 2)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

CFTU4 ADC (all sector 2)^{Entries 1094756}Mean 109.3

RMS 53.35

CFTU4 ADC (all sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTX8 ADC (all sector 2)^{Entries 1223082}Mean 134

RMS 54.21

CFTX8 ADC (all sector 2)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

CFTV4 ADC (all sector 2)^{Entries 1105334}Mean 107.3

RMS 52.14

CFTV4 ADC (all sector 2)

Cft ADC (all not sector 2) (All Clusters)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500 2 x10^{CFTX1 ADC (all not sector 2)}

Entries 1.126959e+07 Mean 143.7 RMS 53.07

CFTX1 ADC (all not sector 2)

0 50 100 150 200 250 300 0 500

1000

1500

2000

2500 2 x10^{CFTU1 ADC (all not sector 2)}

Entries 1.051754e+07 Mean 117.7 RMS 56.15

CFTU1 ADC (all not sector 2)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500 2 x10^{CFTX2 ADC (all not sector 2)}

Entries 1.060362e+07 Mean 143.7 RMS 52.57

CFTX2 ADC (all not sector 2)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200 2 x10^{CFTV1 ADC (all not sector 2)}

Entries 9893104 Mean 122 RMS 55.68

CFTV1 ADC (all not sector 2)

0 50 100 150 200 250 300 0

1000

2000

3000

4000

5000 2 x10^{CFTX3 ADC (all not sector 2)}

Entries 1.392242e+07 Mean 142.5 RMS 53.29

CFTX3 ADC (all not sector 2)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000 2 x10^{CFTU2 ADC (all not sector 2)}

Entries 1.318015e+07 Mean 121.2 RMS 55.89

CFTU2 ADC (all not sector 2)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000 2 x10^{CFTX4 ADC (all not sector 2)}

Entries 1.31237e+07 Mean 138.2 RMS 53.75

CFTX4 ADC (all not sector 2)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200 2 x10^{CFTV2 ADC (all not sector 2)}

Entries 1.240518e+07 Mean 118.6 RMS 55.57

CFTV2 ADC (all not sector 2)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500 2 x10^{CFTX5 ADC (all not sector 2)}

Entries 1.217708e+07 Mean 138.5 RMS 53.78

CFTX5 ADC (all not sector 2)

0 50 100 150 200 250 300 0

500

1000

1500

2000

2500 2 x10^{CFTU3 ADC (all not sector 2)}

Entries 1.160466e+07 Mean 120.9 RMS 55.17

CFTU3 ADC (all not sector 2)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500 2 x10^{CFTX6 ADC (all not sector 2)}

Entries 1.126352e+07 Mean 137.7 RMS 53.95

CFTX6 ADC (all not sector 2)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

2000 2 x10^{CFTV3 ADC (all not sector 2)}

Entries 1.046087e+07 Mean 117.9 RMS 54.25

CFTV3 ADC (all not sector 2)

0 50 100 150 200 250 300 0

500

1000

1500

2000

2500 2 x10^{CFTX7 ADC (all not sector 2)}

Entries 1.034308e+07 Mean 132.3 RMS 53.3

CFTX7 ADC (all not sector 2)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400 2 x10^{CFTU4 ADC (all not sector 2)}

Entries 9665840 Mean 110.8 RMS 53.81

CFTU4 ADC (all not sector 2)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000 2 x10^{CFTX8 ADC (all not sector 2)}

Entries 1.081739e+07 Mean 134 RMS 53.65

CFTX8 ADC (all not sector 2)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600 2 x10^{CFTV4 ADC (all not sector 2)}

Entries 1.018574e+07 Mean 111 RMS 53.51

CFTV4 ADC (all not sector 2)

Cft ADC (singlet sector 2) (All Clusters)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX1 ADC (singlet sector 2)

Entries 398228 Mean 134.4 RMS 54.74

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

CFTU1 ADC (singlet sector 2)

Entries 388559 Mean 107.3 RMS 54.99

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX2 ADC (singlet sector 2)

Entries 375530 Mean 132.4 RMS 54.73

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

CFTV1 ADC (singlet sector 2)

Entries 370975 Mean 106.2 RMS 54.58

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX3 ADC (singlet sector 2)

Entries 516273 Mean 125.5 RMS 55.52

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

CFTU2 ADC (singlet sector 2)

Entries 492964 Mean 110.4 RMS 55.09

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000^{CFTX4 ADC (singlet sector 2)}

Entries 501087 Mean 128.3 RMS 55.66

CFTX4 ADC (singlet sector 2)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTV2 ADC (singlet sector 2)

Entries 513699 Mean 109.2 RMS 55.64

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTX5 ADC (singlet sector 2)

Entries 493358 Mean 124.2 RMS 56.01

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTU3 ADC (singlet sector 2)

Entries 479975 Mean 110.2 RMS 53.74

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX6 ADC (singlet sector 2)

Entries 488523 Mean 126.4 RMS 55.19

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

CFTV3 ADC (singlet sector 2)

Entries 521817 Mean 97.13 RMS 54.11

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX7 ADC (singlet sector 2)

Entries 467374 Mean 124.5 RMS 55.59

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTU4 ADC (singlet sector 2)

Entries 455505 Mean 102.2 RMS 52.51

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000^{CFTX8 ADC (singlet sector 2)}

Entries 485261 Mean 124.4 RMS 55.99

CFTX8 ADC (singlet sector 2)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTV4 ADC (singlet sector 2)

Entries 455096 Mean 100.3 RMS 50.88

Cft ADC (singlet not sector 2) (All Clusters)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10^{CFTX1 ADC (singlet not sector 2)}

Entries 3540964 Mean 133.4 RMS 55.77

CFTX1 ADC (singlet not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

CFTU1 ADC (singlet not sector 2)

Entries 3497164 Mean 107.6 RMS 55.62

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10^{CFTX2 ADC (singlet not sector 2)}

Entries 3454369 Mean 132.9 RMS 55.85

CFTX2 ADC (singlet not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTV1 ADC (singlet not sector 2)

Entries 3354219 Mean 112.7 RMS 55.86

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

2 x10^{CFTX3 ADC (singlet not sector 2)}

Entries 4622556 Mean 131.3 RMS 56.09

CFTX3 ADC (singlet not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTU2 ADC (singlet not sector 2)

Entries 4461530 Mean 110.8 RMS 55.9

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10^{CFTX4 ADC (singlet not sector 2)}

Entries 4556612 Mean 127.1 RMS 56.48

CFTX4 ADC (singlet not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTV2 ADC (singlet not sector 2)

Entries 4384413 Mean 109.1 RMS 55.6

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10^{CFTX5 ADC (singlet not sector 2)}

Entries 4455741 Mean 128.2 RMS 56.02

CFTX5 ADC (singlet not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

CFTU3 ADC (singlet not sector 2)

Entries 4274860 Mean 112 RMS 55.21

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10^{CFTX6 ADC (singlet not sector 2)}

Entries 4448415 Mean 128 RMS 56.24

CFTX6 ADC (singlet not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTV3 ADC (singlet not sector 2)

Entries 4246937 Mean 110.2 RMS 53.87

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000^{CFTX7 ADC (singlet not sector 2)}

Entries 4226500 Mean 123.4 RMS 54.57

CFTX7 ADC (singlet not sector 2)

0 50 100 150 200 250 300 0

10000

20000

30000

40000

50000

CFTU4 ADC (singlet not sector 2)

Entries 4058474 Mean 103 RMS 52.87

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

1 x10^{CFTX8 ADC (singlet not sector 2)}

Entries 4354107 Mean 124.3 RMS 55.4

CFTX8 ADC (singlet not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

CFTV4 ADC (singlet not sector 2)

Entries 4175161 Mean 103.2 RMS 52.65

Cft ADC (doublet low sector 2) (All Clusters)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX1 ADC (doublet low sector 2)

Entries 302813 Mean 129.4 RMS 51.94

0 50 100 150 200 250 300 0

1000

2000

3000

4000

5000

CFTU1 ADC (doublet low sector 2)

Entries 269990 Mean 98.06 RMS 52.65

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000^{CFTX2 ADC (doublet low sector 2)}

Entries 292272 Mean 127.1 RMS 51.59

CFTX2 ADC (doublet low sector 2)

0 50 100 150 200 250 300 0

1000

2000

3000

4000

5000^{CFTV1 ADC (doublet low sector 2)}

Entries 266641 Mean 96.13 RMS 50.91

CFTV1 ADC (doublet low sector 2)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX3 ADC (doublet low sector 2)

Entries 366982 Mean 120.3 RMS 52.4

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTU2 ADC (doublet low sector 2)

Entries 349533 Mean 102.8 RMS 52.08

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX4 ADC (doublet low sector 2)

Entries 360415 Mean 124.7 RMS 51.73

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500

CFTV2 ADC (doublet low sector 2)

Entries 330196 Mean 100.9 RMS 51.6

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTX5 ADC (doublet low sector 2)

Entries 322309 Mean 117.2 RMS 52.31

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500

CFTU3 ADC (doublet low sector 2)

Entries 309979 Mean 100.3 RMS 49.44

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

CFTX6 ADC (doublet low sector 2)

Entries 296546 Mean 119.5 RMS 51.03

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

CFTV3 ADC (doublet low sector 2)

Entries 266310 Mean 91.37 RMS 48.17

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

CFTX7 ADC (doublet low sector 2)

Entries 288485 Mean 118.5 RMS 51.54

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

CFTU4 ADC (doublet low sector 2)

Entries 255883 Mean 92.14 RMS 48.92

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

CFTX8 ADC (doublet low sector 2)

Entries 296985 Mean 118.4 RMS 51.75

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

CFTV4 ADC (doublet low sector 2)

Entries 262257 Mean 90.77 RMS 47.44

Cft ADC (doublet low not sector 2) (All Clusters)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTX1 ADC (doublet low not sector 2)

Entries 2645212 Mean 126.8 RMS 53.28

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

CFTU1 ADC (doublet low not sector 2)

Entries 2424450 Mean 99.54 RMS 53.11

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTX2 ADC (doublet low not sector 2)

Entries 2615360 Mean 128.1 RMS 52.38

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

CFTV1 ADC (doublet low not sector 2)

Entries 2402171 Mean 104 RMS 52.83

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTX3 ADC (doublet low not sector 2)

Entries 3323995 Mean 127.5 RMS 53.01

0 50 100 150 200 250 300 0

10000

20000

30000

40000

50000

CFTU2 ADC (doublet low not sector 2)

Entries 3122580 Mean 103.8 RMS 53

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTX4 ADC (doublet low not sector 2)

Entries 3189846 Mean 123.3 RMS 52.68

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTV2 ADC (doublet low not sector 2)

Entries 2973053 Mean 101.1 RMS 52.05

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTX5 ADC (doublet low not sector 2)

Entries 2958475 Mean 123.1 RMS 52.13

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

CFTU3 ADC (doublet low not sector 2)

Entries 2767974 Mean 103.9 RMS 51.52

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTX6 ADC (doublet low not sector 2)

Entries 2682500 Mean 122.6 RMS 52.14

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTV3 ADC (doublet low not sector 2)

Entries 2444940 Mean 100.8 RMS 50.32

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTX7 ADC (doublet low not sector 2)

Entries 2451847 Mean 116.5 RMS 50.71

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTU4 ADC (doublet low not sector 2)

Entries 2246531 Mean 94.53 RMS 49.55

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000^{CFTX8 ADC (doublet low not sector 2)}

Entries 2597539 Mean 118.7 RMS 51.34

CFTX8 ADC (doublet low not sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTV4 ADC (doublet low not sector 2)

Entries 2414719 Mean 94.56 RMS 49.14

Cft ADC (doublet high sector 2) (All Clusters)

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTX1 ADC (doublet high sector 2)

Entries 302813 Mean 169 RMS 35.95

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

CFTU1 ADC (doublet high sector 2)

Entries 269990 Mean 141.7 RMS 47.94

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX2 ADC (doublet high sector 2)

Entries 292272 Mean 166.8 RMS 37.32

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTV1 ADC (doublet high sector 2)

Entries 266641 Mean 140.2 RMS 48.75

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTX3 ADC (doublet high sector 2)

Entries 366982 Mean 161.8 RMS 41.33

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

CFTU2 ADC (doublet high sector 2)

Entries 349533 Mean 146 RMS 47.51

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

CFTX4 ADC (doublet high sector 2)

Entries 360415 Mean 164.8 RMS 38.64

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

CFTV2 ADC (doublet high sector 2)

Entries 330196 Mean 144.7 RMS 47.85

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX5 ADC (doublet high sector 2)

Entries 322309 Mean 160.8 RMS 42.77

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTU3 ADC (doublet high sector 2)

Entries 309979 Mean 143.7 RMS 47.22

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX6 ADC (doublet high sector 2)

Entries 296546 Mean 162.1 RMS 40.61

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

CFTV3 ADC (doublet high sector 2)

Entries 266310 Mean 134 RMS 48.71

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX7 ADC (doublet high sector 2)

Entries 288485 Mean 160.9 RMS 40.6

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

CFTU4 ADC (doublet high sector 2)

Entries 255883 Mean 134.7 RMS 48.3

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX8 ADC (doublet high sector 2)

Entries 296985 Mean 161 RMS 42.29

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTV4 ADC (doublet high sector 2)

Entries 262257 Mean 131.8 RMS 48.33

Cft ADC (doublet high not sector 2) (All Clusters)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400 2 x10^{CFTX1 ADC (doublet high not sector 2)}

Entries 2645212 Mean 168 RMS 39.21

CFTX1 ADC (doublet high not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTU1 ADC (doublet high not sector 2)

Entries 2424450 Mean 143 RMS 48.87

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

2 x10^{CFTX2 ADC (doublet high not sector 2)}

Entries 2615360 Mean 168.5 RMS 37.93

CFTX2 ADC (doublet high not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTV1 ADC (doublet high not sector 2)

Entries 2402171 Mean 147.2 RMS 47.59

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600 2 x10^{CFTX3 ADC (doublet high not sector 2)}

Entries 3323995 Mean 167.5 RMS 39.44

CFTX3 ADC (doublet high not sector 2)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

1 x10^{CFTU2 ADC (doublet high not sector 2)}

Entries 3122580 Mean 146.7 RMS 47.84

CFTU2 ADC (doublet high not sector 2)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600 2 x10^{CFTX4 ADC (doublet high not sector 2)}

Entries 3189846 Mean 163.9 RMS 40.19

CFTX4 ADC (doublet high not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTV2 ADC (doublet high not sector 2)

Entries 2973053 Mean 144.2 RMS 48.07

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400 2 x10^{CFTX5 ADC (doublet high not sector 2)}

Entries 2958475 Mean 165 RMS 40.76

CFTX5 ADC (doublet high not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTU3 ADC (doublet high not sector 2)

Entries 2767974 Mean 146.9 RMS 47.63

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10^{CFTX6 ADC (doublet high not sector 2)}

Entries 2682500 Mean 164.7 RMS 40.5

CFTX6 ADC (doublet high not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

CFTV3 ADC (doublet high not sector 2)

Entries 2444940 Mean 143.7 RMS 47.92

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTX7 ADC (doublet high not sector 2)

Entries 2451847 Mean 159.5 RMS 41.92

0 50 100 150 200 250 300 0

10000

20000

30000

40000

50000

CFTU4 ADC (doublet high not sector 2)

Entries 2246531 Mean 136.3 RMS 48.89

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10^{CFTX8 ADC (doublet high not sector 2)}

Entries 2597539 Mean 161.3 RMS 41.21

CFTX8 ADC (doublet high not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTV4 ADC (doublet high not sector 2)

Entries 2414719 Mean 136.1 RMS 48.54

Cft ADC (all) (Clusters on tracks)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

2 x10CFTX1 ADC (all)

Entries 3427427 Mean 147.5 RMS 49.93

CFTX1 ADC (all)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

CFTU1 ADC (all)^{Entries 2439977}Mean 117.8_{RMS 53.94}

CFTU1 ADC (all)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

1 x10CFTX2 ADC (all)

Entries 3148261 Mean 147.9 RMS 48.86

CFTX2 ADC (all)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTV1 ADC (all)^{Entries 2251876}Mean 121.7_{RMS 53.16}

CFTV1 ADC (all)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10CFTX3 ADC (all)

Entries 3320300 Mean 145.7 RMS 50.19

CFTX3 ADC (all)

0 50 100 150 200 250 300 0

10000

20000

30000

40000

50000

CFTU2 ADC (all)^{Entries 2420919}Mean 121_{RMS 53.45}

CFTU2 ADC (all)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10CFTX4 ADC (all)

Entries 3102210 Mean 142.8 RMS 50.04

CFTX4 ADC (all)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTV2 ADC (all)^{Entries 2266074}Mean 118.9_{RMS 52.98}

CFTV2 ADC (all)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10CFTX5 ADC (all)

Entries 2891518 Mean 142.4 RMS 50.56

CFTX5 ADC (all)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

CFTU3 ADC (all)^{Entries 2149736}Mean 121.6_{RMS 52.35}

CFTU3 ADC (all)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTX6 ADC (all)^{Entries 2936606}Mean 142.9_{RMS 50.32}

CFTX6 ADC (all)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTV3 ADC (all)^{Entries 1989782}Mean 117.7_{RMS 51.61}

CFTV3 ADC (all)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

CFTX7 ADC (all)^{Entries 2839898}Mean 137.7_{RMS 50.42}

CFTX7 ADC (all)

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTU4 ADC (all)^{Entries 1950641}Mean 111.4_{RMS 50.98}

CFTU4 ADC (all)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTX8 ADC (all)^{Entries 2924517}Mean 140.4_{RMS 50.46}

CFTX8 ADC (all)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTV4 ADC (all)^{Entries 2016557}Mean 112.3_{RMS 50.7}

CFTV4 ADC (all)

Cft ADC (singlet) (Clusters on tracks)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

CFTX1 ADC (singlet)^{Entries 760803}Mean 147.4_{RMS 48.32}

CFTX1 ADC (singlet)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTU1 ADC (singlet)^{Entries 624685}Mean 113.2_{RMS 51.15}

CFTU1 ADC (singlet)

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTX2 ADC (singlet)^{Entries 729323}Mean 150.6_{RMS 46.41}

CFTX2 ADC (singlet)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTV1 ADC (singlet)^{Entries 604169}Mean 120.1_{RMS 50.7}

CFTV1 ADC (singlet)

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTX3 ADC (singlet)^{Entries 754915}Mean 145.9_{RMS 48.46}

CFTX3 ADC (singlet)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTU2 ADC (singlet)^{Entries 605813}Mean 117.2_{RMS 50.76}

CFTU2 ADC (singlet)

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTX4 ADC (singlet)^{Entries 730893}Mean 144.1_{RMS 48.09}

CFTX4 ADC (singlet)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

CFTV2 ADC (singlet)^{Entries 595236}Mean 116.3_{RMS 50.67}

CFTV2 ADC (singlet)

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTX5 ADC (singlet)^{Entries 727172}Mean 143.5_{RMS 48.78}

CFTX5 ADC (singlet)

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTU3 ADC (singlet)^{Entries 580798}Mean 119.9_{RMS 50.19}

CFTU3 ADC (singlet)

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTX6 ADC (singlet)^{Entries 803101}Mean 143.7_{RMS 48.92}

CFTX6 ADC (singlet)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

CFTV3 ADC (singlet)^{Entries 618173}Mean 115.5_{RMS 49.71}

CFTV3 ADC (singlet)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

CFTX7 ADC (singlet)^{Entries 794171}Mean 137_{RMS 49.2}

CFTX7 ADC (singlet)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTU4 ADC (singlet)^{Entries 622620}Mean 108_{RMS 48.85}

CFTU4 ADC (singlet)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

CFTX8 ADC (singlet)^{Entries 692184}Mean 138.5_{RMS 49.68}

CFTX8 ADC (singlet)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTV4 ADC (singlet)^{Entries 542482}Mean 107.9_{RMS 48.32}

CFTV4 ADC (singlet)

Cft ADC (doublet low) (Clusters on tracks)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX1 ADC (doublet low)^{Entries 716489}_{Mean 119.5}

RMS 51.05

CFTX1 ADC (doublet low)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTU1 ADC (doublet low)^{Entries 502734}_{Mean 89.45}

RMS 47.91

CFTU1 ADC (doublet low)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX2 ADC (doublet low)^{Entries 732766}_{Mean 120.2}

RMS 50.15

CFTX2 ADC (doublet low)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTV1 ADC (doublet low)^{Entries 516643}_{Mean 92.84}

RMS 47.38

CFTV1 ADC (doublet low)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX3 ADC (doublet low)^{Entries 751056}_{Mean 118.3}

RMS 50.8

CFTX3 ADC (doublet low)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTU2 ADC (doublet low)^{Entries 550055}_{Mean 93.01}

RMS 47.95

CFTU2 ADC (doublet low)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX4 ADC (doublet low)^{Entries 758383}_{Mean 115.7}

RMS 50.25

CFTX4 ADC (doublet low)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTV2 ADC (doublet low)^{Entries 547010}_{Mean 91.3}

RMS 46.73

CFTV2 ADC (doublet low)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX5 ADC (doublet low)^{Entries 740270}_{Mean 115.3}

RMS 49.68

CFTX5 ADC (doublet low)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTU3 ADC (doublet low)^{Entries 542606}_{Mean 94.71}

RMS 46.24

CFTU3 ADC (doublet low)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX6 ADC (doublet low)^{Entries 752917}_{Mean 116.8}

RMS 50.03

CFTX6 ADC (doublet low)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTV3 ADC (doublet low)^{Entries 501862}_{Mean 91.89}

RMS 44.66

CFTV3 ADC (doublet low)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

CFTX7 ADC (doublet low)^{Entries 747580}Mean 112.2

RMS 48.61

CFTX7 ADC (doublet low)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTU4 ADC (doublet low)^{Entries 507516}Mean 87.18

RMS 43.59

CFTU4 ADC (doublet low)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX8 ADC (doublet low)^{Entries 832866}Mean 116.1

RMS 49.63

CFTX8 ADC (doublet low)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

CFTV4 ADC (doublet low)^{Entries 570033}Mean 88.44

RMS 43.54

CFTV4 ADC (doublet low)

Cft ADC (doublet high) (Clusters on tracks)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTX1 ADC (doublet high)

Entries 716489 Mean 167.6 RMS 37.11

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000^{CFTU1 ADC (doublet high)}

Entries 502734 Mean 138.7 RMS 47.58

CFTU1 ADC (doublet high)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000^{CFTX2 ADC (doublet high)}

Entries 732766 Mean 168.1 RMS 35.69

CFTX2 ADC (doublet high)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTV1 ADC (doublet high)

Entries 516643 Mean 142.8 RMS 46.42

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTX3 ADC (doublet high)

Entries 751056 Mean 166 RMS 38

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTU2 ADC (doublet high)

Entries 550055 Mean 142 RMS 46.8

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTX4 ADC (doublet high)

Entries 758383 Mean 163.5 RMS 38.06

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTV2 ADC (doublet high)

Entries 547010 Mean 140.3 RMS 46.76

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTX5 ADC (doublet high)

Entries 740270 Mean 163.9 RMS 39.32

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTU3 ADC (doublet high)

Entries 542606 Mean 143.6 RMS 46.07

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTX6 ADC (doublet high)

Entries 752917 Mean 164.5 RMS 38.69

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTV3 ADC (doublet high)

Entries 501862 Mean 139.9 RMS 46.55

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

CFTX7 ADC (doublet high)

Entries 747580 Mean 160 RMS 40.26

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTU4 ADC (doublet high)

Entries 507516 Mean 133.9 RMS 46.82

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTX8 ADC (doublet high)

Entries 832866 Mean 162.7 RMS 39.22

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTV4 ADC (doublet high)

Entries 570033 Mean 134.4 RMS 46.29

Cft ADC (doublet sum) (Clusters on tracks)

0 100 200 300 400 500 600 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

CFTX1 ADC (doublet sum)

Entries 716489 Mean 287.1 RMS 78.37

0 100 200 300 400 500 600 0

1000

2000

3000

4000

5000

CFTU1 ADC (doublet sum)

Entries 502734 Mean 228.2 RMS 86.43

0 100 200 300 400 500 600 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX2 ADC (doublet sum)

Entries 732766 Mean 288.3 RMS 76.24

0 100 200 300 400 500 600 0

1000

2000

3000

4000

5000

CFTV1 ADC (doublet sum)

Entries 516643 Mean 235.7 RMS 84.62

0 100 200 300 400 500 600 0 2000

4000

6000

8000

10000

12000

14000

CFTX3 ADC (doublet sum)

Entries 751056 Mean 284.3 RMS 79.32

0 100 200 300 400 500 600 0 1000

2000

3000

4000

5000

CFTU2 ADC (doublet sum)

Entries 550055 Mean 235 RMS 85.81

0 100 200 300 400 500 600 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX4 ADC (doublet sum)

Entries 758383 Mean 279.2 RMS 78.86

0 100 200 300 400 500 600 0 500 1000

1500

2000

2500

3000

3500

4000

4500

CFTV2 ADC (doublet sum)

Entries 547010 Mean 231.6 RMS 84.63

0 100 200 300 400 500 600 0 2000

4000

6000

8000

10000

12000

14000^{CFTX5 ADC (doublet sum)}

Entries 740270 Mean 279.2 RMS 79.57

CFTX5 ADC (doublet sum)

0 100 200 300 400 500 600 0 500 1000

1500

2000

2500

3000

3500

4000

4500

CFTU3 ADC (doublet sum)

Entries 542606 Mean 238.3 RMS 83.43

0 100 200 300 400 500 600 0 2000

4000

6000

8000

10000

12000

14000

CFTX6 ADC (doublet sum)

Entries 752917 Mean 281.3 RMS 79.41

0 100 200 300 400 500 600 0 500 1000

1500

2000

2500

3000

3500

4000

4500

CFTV3 ADC (doublet sum)

Entries 501862 Mean 231.8 RMS 82.63

0 100 200 300 400 500 600 0 2000

4000

6000

8000

10000

12000^{CFTX7 ADC (doublet sum)}

Entries 747580 Mean 272.2 RMS 79.75

CFTX7 ADC (doublet sum)

0 100 200 300 400 500 600 0

1000

2000

3000

4000

5000^{CFTU4 ADC (doublet sum)}

Entries 507516 Mean 221.1 RMS 82.2

CFTU4 ADC (doublet sum)

0 100 200 300 400 500 600 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX8 ADC (doublet sum)

Entries 832866 Mean 278.7 RMS 79.92

0 100 200 300 400 500 600 0 1000

2000

3000

4000

5000

CFTV4 ADC (doublet sum)

Entries 570033 Mean 222.9 RMS 81.68

Cft ADC (all sector 2) (Clusters on tracks)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

CFTX1 ADC (all sector 2)^{Entries 359590}_{Mean 150}

RMS 47.74

CFTX1 ADC (all sector 2)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTU1 ADC (all sector 2)^{Entries 251529}_{Mean 117.1}

RMS 53.36

CFTU1 ADC (all sector 2)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX2 ADC (all sector 2)^{Entries 323592}_{Mean 146.3}

RMS 48.5

CFTX2 ADC (all sector 2)

0 50 100 150 200 250 300 0

1000

2000

3000

4000

5000

CFTV1 ADC (all sector 2)^{Entries 230724}_{Mean 114.2}

RMS 52.52

CFTV1 ADC (all sector 2)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX3 ADC (all sector 2)^{Entries 341106}_{Mean 139.3}

RMS 50.91

CFTX3 ADC (all sector 2)

0 50 100 150 200 250 300 0

1000

2000

3000

4000

5000

CFTU2 ADC (all sector 2)^{Entries 250793}_{Mean 120.6}

RMS 52.98

CFTU2 ADC (all sector 2)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX4 ADC (all sector 2)^{Entries 323049}_{Mean 143.6}

RMS 49.1

CFTX4 ADC (all sector 2)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

CFTV2 ADC (all sector 2)^{Entries 232047}_{Mean 118.2}

RMS 52.69

CFTV2 ADC (all sector 2)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

CFTX5 ADC (all sector 2)^{Entries 292962}_{Mean 137.1}

RMS 51.71

CFTX5 ADC (all sector 2)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500

CFTU3 ADC (all sector 2)^{Entries 218709}_{Mean 118.7}

RMS 51.1

CFTU3 ADC (all sector 2)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

CFTX6 ADC (all sector 2)^{Entries 300116}_{Mean 139.9}

RMS 50.07

CFTX6 ADC (all sector 2)

0 50 100 150 200 250 300 0

500

1000

1500

2000

2500

CFTV3 ADC (all sector 2)^{Entries 202155}_{Mean 107.1}

RMS 49.73

CFTV3 ADC (all sector 2)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

CFTX7 ADC (all sector 2)^{Entries 298160}Mean 140

RMS 50.13

CFTX7 ADC (all sector 2)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

CFTU4 ADC (all sector 2)^{Entries 199192}Mean 109.6

RMS 50.4

CFTU4 ADC (all sector 2)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

CFTX8 ADC (all sector 2)^{Entries 300454}Mean 140.2

RMS 51.07

CFTX8 ADC (all sector 2)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

CFTV4 ADC (all sector 2)^{Entries 205276}Mean 107

RMS 49.11

CFTV4 ADC (all sector 2)

Cft ADC (all not sector 2) (Clusters on tracks)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200 2 x10^{CFTX1 ADC (all not sector 2)}

Entries 3067837 Mean 147.2 RMS 50.17

CFTX1 ADC (all not sector 2)

0 50 100 150 200 250 300 0

10000

20000

30000

40000

50000

CFTU1 ADC (all not sector 2)

Entries 2188448 Mean 117.9 RMS 54.01

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10^{CFTX2 ADC (all not sector 2)}

Entries 2824669 Mean 148.1 RMS 48.9

CFTX2 ADC (all not sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

CFTV1 ADC (all not sector 2)

Entries 2021152 Mean 122.6 RMS 53.17

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10^{CFTX3 ADC (all not sector 2)}

Entries 2979194 Mean 146.4 RMS 50.05

CFTX3 ADC (all not sector 2)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

CFTU2 ADC (all not sector 2)

Entries 2170126 Mean 121.1 RMS 53.5

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTX4 ADC (all not sector 2)

Entries 2779161 Mean 142.7 RMS 50.15

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTV2 ADC (all not sector 2)

Entries 2034027 Mean 119 RMS 53.02

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

CFTX5 ADC (all not sector 2)

Entries 2598556 Mean 143 RMS 50.39

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

35000

CFTU3 ADC (all not sector 2)

Entries 1931027 Mean 121.9 RMS 52.48

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTX6 ADC (all not sector 2)

Entries 2636490 Mean 143.3 RMS 50.34

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTV3 ADC (all not sector 2)

Entries 1787627 Mean 118.9 RMS 51.68

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

CFTX7 ADC (all not sector 2)

Entries 2541738 Mean 137.4 RMS 50.45

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000^{CFTU4 ADC (all not sector 2)}

Entries 1751449 Mean 111.7 RMS 51.04

CFTU4 ADC (all not sector 2)

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

70000

80000

CFTX8 ADC (all not sector 2)

Entries 2624063 Mean 140.4 RMS 50.38

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTV4 ADC (all not sector 2)

Entries 1811281 Mean 112.9 RMS 50.84

Cft ADC (singlet sector 2) (Clusters on tracks)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

CFTX1 ADC (singlet sector 2)

Entries 76046 Mean 151.3 RMS 45.92

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

CFTU1 ADC (singlet sector 2)

Entries 64760 Mean 113.3 RMS 50.17

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

CFTX2 ADC (singlet sector 2)

Entries 74589 Mean 147.8 RMS 46.5

0 50 100 150 200 250 300 0 200 400 600 800 1000

CFTV1 ADC (singlet sector 2)

Entries 62154 Mean 112.1 RMS 49.43

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

CFTX3 ADC (singlet sector 2)

Entries 79758 Mean 138.7 RMS 49.09

0 50 100 150 200 250 300 0

200

400

600

800

1000

CFTU2 ADC (singlet sector 2)

Entries 62030 Mean 117.2 RMS 50.16

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

CFTX4 ADC (singlet sector 2)

Entries 74041 Mean 145.4 RMS 46.83

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 800 900 CFTV2 ADC (singlet sector 2)

Entries 62482 Mean 115.7 RMS 50.01

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

CFTX5 ADC (singlet sector 2)

Entries 76764 Mean 137.4 RMS 49.88

0 50 100 150 200 250 300 0 200 400 600 800 1000

CFTU3 ADC (singlet sector 2)

Entries 59616 Mean 117.7 RMS 48.68

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

CFTX6 ADC (singlet sector 2)

Entries 83369 Mean 140.6 RMS 48.73

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 CFTV3 ADC (singlet sector 2)

Entries 65936 Mean 104.6 RMS 47.22

0 50 100 150 200 250 300 0

500

1000

1500

2000

2500

CFTX7 ADC (singlet sector 2)

Entries 75677 Mean 140.6 RMS 48.74

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 CFTU4 ADC (singlet sector 2)

Entries 62795 Mean 107 RMS 48.01

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

2000^{CFTX8 ADC (singlet sector 2)}

Entries 68962 Mean 139.1 RMS 50.14

CFTX8 ADC (singlet sector 2)

0 50 100 150 200 250 300 0 100 200 300 400 500 600 CFTV4 ADC (singlet sector 2)

Entries 57684 Mean 102.3 RMS 46.33

Cft ADC (singlet not sector 2) (Clusters on tracks)

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

CFTX1 ADC (singlet not sector 2)

Entries 684757 Mean 147 RMS 48.56

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTU1 ADC (singlet not sector 2)

Entries 559925 Mean 113.2 RMS 51.26

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000^{CFTX2 ADC (singlet not sector 2)}

Entries 654734 Mean 150.9 RMS 46.39

CFTX2 ADC (singlet not sector 2)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

CFTV1 ADC (singlet not sector 2)

Entries 542015 Mean 121 RMS 50.76

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

CFTX3 ADC (singlet not sector 2)

Entries 675157 Mean 146.7 RMS 48.32

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

CFTU2 ADC (singlet not sector 2)

Entries 543783 Mean 117.3 RMS 50.83

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

CFTX4 ADC (singlet not sector 2)

Entries 656852 Mean 144 RMS 48.23

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

CFTV2 ADC (singlet not sector 2)

Entries 532754 Mean 116.3 RMS 50.75

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

CFTX5 ADC (singlet not sector 2)

Entries 650408 Mean 144.2 RMS 48.6

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

CFTU3 ADC (singlet not sector 2)

Entries 521182 Mean 120.2 RMS 50.35

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

CFTX6 ADC (singlet not sector 2)

Entries 719732 Mean 144 RMS 48.93

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

CFTV3 ADC (singlet not sector 2)

Entries 552237 Mean 116.8 RMS 49.84

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

CFTX7 ADC (singlet not sector 2)

Entries 718494 Mean 136.7 RMS 49.23

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTU4 ADC (singlet not sector 2)

Entries 559825 Mean 108.1 RMS 48.94

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

CFTX8 ADC (singlet not sector 2)

Entries 623222 Mean 138.4 RMS 49.63

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

CFTV4 ADC (singlet not sector 2)

Entries 484798 Mean 108.6 RMS 48.51

Cft ADC (doublet low sector 2) (Clusters on tracks)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400

CFTX1 ADC (doublet low sector 2)

Entries 74739 Mean 123.3 RMS 50.4

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 CFTU1 ADC (doublet low sector 2)

Entries 51902 Mean 88.39 RMS 47.75

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

CFTX2 ADC (doublet low sector 2)

Entries 75789 Mean 119.2 RMS 49.79

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 CFTV1 ADC (doublet low sector 2)

Entries 52856 Mean 85.35 RMS 44.32

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

CFTX3 ADC (doublet low sector 2)

Entries 76160 Mean 111.4 RMS 49.75

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 CFTU2 ADC (doublet low sector 2)

Entries 56918 Mean 92.51 RMS 47.12

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

CFTX4 ADC (doublet low sector 2)

Entries 79639 Mean 116.8 RMS 49.61

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 CFTV2 ADC (doublet low sector 2)

Entries 55501 Mean 90.3 RMS 46.13

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 800 900 CFTX5 ADC (doublet low sector 2)

Entries 74014 Mean 109.1 RMS 49.21

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 CFTU3 ADC (doublet low sector 2)

Entries 55433 Mean 91.37 RMS 43.74

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

CFTX6 ADC (doublet low sector 2)

Entries 76792 Mean 113.4 RMS 48.7

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 800^{CFTV3 ADC (doublet low sector 2)}

Entries 49699 Mean 81.88 RMS 40.46

CFTV3 ADC (doublet low sector 2)

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

CFTX7 ADC (doublet low sector 2)

Entries 80925 Mean 114.3 RMS 49.71

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 CFTU4 ADC (doublet low sector 2)

Entries 52334 Mean 84.59 RMS 42.56

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

CFTX8 ADC (doublet low sector 2)

Entries 86011 Mean 115.4 RMS 50.04

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 800 CFTV4 ADC (doublet low sector 2)

Entries 57090 Mean 83.72 RMS 40.56

Cft ADC (doublet low not sector 2) (Clusters on tracks)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX1 ADC (doublet low not sector 2)

Entries 641750 Mean 119.1 RMS 51.11

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

CFTU1 ADC (doublet low not sector 2)

Entries 450832 Mean 89.58 RMS 47.93

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX2 ADC (doublet low not sector 2)

Entries 656977 Mean 120.3 RMS 50.19

0 50 100 150 200 250 300 0

1000

2000

3000

4000

5000

CFTV1 ADC (doublet low not sector 2)

Entries 463787 Mean 93.7 RMS 47.65

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX3 ADC (doublet low not sector 2)

Entries 674896 Mean 119.1 RMS 50.86

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

CFTU2 ADC (doublet low not sector 2)

Entries 493137 Mean 93.07 RMS 48.05

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX4 ADC (doublet low not sector 2)

Entries 678744 Mean 115.5 RMS 50.33

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

CFTV2 ADC (doublet low not sector 2)

Entries 491509 Mean 91.41 RMS 46.8

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX5 ADC (doublet low not sector 2)

Entries 666256 Mean 116 RMS 49.68

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

CFTU3 ADC (doublet low not sector 2)

Entries 487173 Mean 95.09 RMS 46.5

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTX6 ADC (doublet low not sector 2)

Entries 676125 Mean 117.2 RMS 50.17

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

CFTV3 ADC (doublet low not sector 2)

Entries 452163 Mean 92.99 RMS 44.96

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000

CFTX7 ADC (doublet low not sector 2)

Entries 666655 Mean 112 RMS 48.47

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

CFTU4 ADC (doublet low not sector 2)

Entries 455182 Mean 87.48 RMS 43.7

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTX8 ADC (doublet low not sector 2)

Entries 746855 Mean 116.2 RMS 49.58

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTV4 ADC (doublet low not sector 2)

Entries 512943 Mean 88.97 RMS 43.83

Cft ADC (doublet high sector 2) (Clusters on tracks)

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

CFTX1 ADC (doublet high sector 2)

Entries 74739 Mean 169.4 RMS 33.72

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

CFTU1 ADC (doublet high sector 2)

Entries 51902 Mean 138 RMS 46.9

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

CFTX2 ADC (doublet high sector 2)

Entries 75789 Mean 166.2 RMS 35.78

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

CFTV1 ADC (doublet high sector 2)

Entries 52856 Mean 135.2 RMS 47.28

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500

CFTX3 ADC (doublet high sector 2)

Entries 76160 Mean 160.2 RMS 40.04

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

CFTU2 ADC (doublet high sector 2)

Entries 56918 Mean 141.4 RMS 46.64

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500

CFTX4 ADC (doublet high sector 2)

Entries 79639 Mean 163.9 RMS 36.95

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

CFTV2 ADC (doublet high sector 2)

Entries 55501 Mean 139.5 RMS 46.81

0 50 100 150 200 250 300 0

500

1000

1500

2000

2500

CFTX5 ADC (doublet high sector 2)

Entries 74014 Mean 159.1 RMS 41.81

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

1600

1800

CFTU3 ADC (doublet high sector 2)

Entries 55433 Mean 140.3 RMS 45.66

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

CFTX6 ADC (doublet high sector 2)

Entries 76792 Mean 161.5 RMS 39.29

0 50 100 150 200 250 300 0

200

400

600

800

1000

CFTV3 ADC (doublet high sector 2)

Entries 49699 Mean 128.8 RMS 46.55

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

CFTX7 ADC (doublet high sector 2)

Entries 80925 Mean 161.6 RMS 38.65

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

CFTU4 ADC (doublet high sector 2)

Entries 52334 Mean 132.1 RMS 46.28

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

CFTX8 ADC (doublet high sector 2)

Entries 86011 Mean 162 RMS 40.42

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

CFTV4 ADC (doublet high sector 2)

Entries 57090 Mean 128.8 RMS 45.83

Cft ADC (doublet high not sector 2) (Clusters on tracks)

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTX1 ADC (doublet high not sector 2)

Entries 641750 Mean 167.4 RMS 37.48

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTU1 ADC (doublet high not sector 2)

Entries 450832 Mean 138.8 RMS 47.66

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTX2 ADC (doublet high not sector 2)

Entries 656977 Mean 168.3 RMS 35.67

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTV1 ADC (doublet high not sector 2)

Entries 463787 Mean 143.7 RMS 46.24

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTX3 ADC (doublet high not sector 2)

Entries 674896 Mean 166.6 RMS 37.71

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTU2 ADC (doublet high not sector 2)

Entries 493137 Mean 142 RMS 46.82

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTX4 ADC (doublet high not sector 2)

Entries 678744 Mean 163.4 RMS 38.19

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

CFTV2 ADC (doublet high not sector 2)

Entries 491509 Mean 140.4 RMS 46.75

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTX5 ADC (doublet high not sector 2)

Entries 666256 Mean 164.4 RMS 39

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

CFTU3 ADC (doublet high not sector 2)

Entries 487173 Mean 144 RMS 46.1

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTX6 ADC (doublet high not sector 2)

Entries 676125 Mean 164.8 RMS 38.61

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

CFTV3 ADC (doublet high not sector 2)

Entries 452163 Mean 141.1 RMS 46.39

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

CFTX7 ADC (doublet high not sector 2)

Entries 666655 Mean 159.8 RMS 40.44

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

CFTU4 ADC (doublet high not sector 2)

Entries 455182 Mean 134.1 RMS 46.88

0 50 100 150 200 250 300 0 5000

10000

15000

20000

25000

30000

CFTX8 ADC (doublet high not sector 2)

Entries 746855 Mean 162.7 RMS 39.08

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

CFTV4 ADC (doublet high not sector 2)

Entries 512943 Mean 135 RMS 46.3

Cft ADC (all) (Clusters on muons)

0 50 100 150 200 250 300 0

200

400

600

800

1000

CFTX1 ADC (all)^{Entries 27627}Mean 149_{RMS 48.55}

CFTX1 ADC (all)

0 50 100 150 200 250 300 0

100

200

300

400

500 CFTU1 ADC (all)^{Entries 26329}Mean 116.9_{RMS 52.67}

CFTU1 ADC (all)

0 50 100 150 200 250 300 0

200

400

600

800

1000

CFTX2 ADC (all)^{Entries 26236}Mean 152.2_{RMS 47.14}

CFTX2 ADC (all)

0 50 100 150 200 250 300 0 50 100 150 200 250 300 350 400 450 CFTV1 ADC (all)^{Entries 24895}Mean 121.4_{RMS 52.59}

CFTV1 ADC (all)

0 50 100 150 200 250 300 0

200

400

600

800

1000

CFTX3 ADC (all)^{Entries 26823}Mean 147.7_{RMS 49.14}

CFTX3 ADC (all)

0 50 100 150 200 250 300 0

100

200

300

400

500 CFTU2 ADC (all)^{Entries 26052}Mean 120.3_{RMS 52.3}

CFTU2 ADC (all)

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 800 900 CFTX4 ADC (all)^{Entries 26078}Mean 146.1_{RMS 48.69}

CFTX4 ADC (all)

0 50 100 150 200 250 300 0 50 100 150 200 250 300 350 400 CFTV2 ADC (all)^{Entries 25212}Mean 120_{RMS 52.59}

CFTV2 ADC (all)

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 800 900 CFTX5 ADC (all)^{Entries 24902}Mean 146.1_{RMS 49.64}

CFTX5 ADC (all)

0 50 100 150 200 250 300 0 50 100 150 200 250 300 350 400 450 CFTU3 ADC (all)^{Entries 24134}Mean 123.4_{RMS 52.06}

CFTU3 ADC (all)

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 800 CFTX6 ADC (all)^{Entries 23249}Mean 146.8_{RMS 48.82}

CFTX6 ADC (all)

0 50 100 150 200 250 300 0 50 100 150 200 250 300 350 CFTV3 ADC (all)^{Entries 22215}Mean 118.1_{RMS 51.5}

CFTV3 ADC (all)

0 50 100 150 200 250 300 0 100 200 300 400 500 600 CFTX7 ADC (all)^{Entries 22242}Mean 141.4_{RMS 49.16}

CFTX7 ADC (all)

0 50 100 150 200 250 300 0 50 100 150 200 250

CFTU4 ADC (all)^{Entries 21345}Mean 113.3_{RMS 50.45}

CFTU4 ADC (all)

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 800 CFTX8 ADC (all)^{Entries 22885}Mean 142.9_{RMS 49.8}

CFTX8 ADC (all)

0 50 100 150 200 250 300 0 50 100 150 200 250 300 CFTV4 ADC (all)^{Entries 22295}Mean 112.6_{RMS 50.02}

CFTV4 ADC (all)

Cft ADC (singlet) (Clusters on muons)

0 50 100 150 200 250 300 0

50

100

150

200

250 CFTX1 ADC (singlet)^{Entries 6367}Mean 156_{RMS 43.65}

CFTX1 ADC (singlet)

0 50 100 150 200 250 300 0 10 20 30 40 50 60 70 80 90 CFTU1 ADC (singlet)^{Entries 6959}Mean 115.9_{RMS 49.61}

CFTU1 ADC (singlet)

0 50 100 150 200 250 300 0

50

100

150 200

250 CFTX2 ADC (singlet)^{Entries 6311}Mean 160.7_{RMS 41.38}

CFTX2 ADC (singlet)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 CFTV1 ADC (singlet)^{Entries 7042}Mean 122.8_{RMS 50.21}

CFTV1 ADC (singlet)

0 50 100 150 200 250 300 0 50 100 150 200 250 CFTX3 ADC (singlet)^{Entries 6434}Mean 154.8_{RMS 44.67}

CFTX3 ADC (singlet)

0 50 100 150 200 250 300 0 20 40 60 80 100 CFTU2 ADC (singlet)^{Entries 6919}Mean 120.7_{RMS 49.84}

CFTU2 ADC (singlet)

0 50 100 150 200 250 300 0

50

100

150

200

250 CFTX4 ADC (singlet)^{Entries 6433}Mean 154.8_{RMS 43.58}

CFTX4 ADC (singlet)

0 50 100 150 200 250 300 0

20

40

60

80

100 CFTV2 ADC (singlet)^{Entries 7004}Mean 121.3_{RMS 50.54}

CFTV2 ADC (singlet)

0 50 100 150 200 250 300 0 50

100 150

200 250 CFTX5 ADC (singlet)^{Entries 6549}Mean 153.4_{RMS 45.39}

CFTX5 ADC (singlet)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 CFTU3 ADC (singlet)^{Entries 6953}Mean 125.8_{RMS 49.9}

CFTU3 ADC (singlet)

0 50 100 150 200 250 300 0 50 100 150 200 250 300 CFTX6 ADC (singlet)^{Entries 6997}Mean 156.2_{RMS 43.91}

CFTX6 ADC (singlet)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 CFTV3 ADC (singlet)^{Entries 7597}Mean 120.7_{RMS 49.91}

CFTV3 ADC (singlet)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 160 180 200 220 CFTX7 ADC (singlet)^{Entries 6923}Mean 150.1_{RMS 45.57}

CFTX7 ADC (singlet)

0 50 100 150 200 250 300 0

20

40

60

80

100 CFTU4 ADC (singlet)^{Entries 7663}Mean 114.9_{RMS 49.26}

CFTU4 ADC (singlet)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 160 180 200 220 CFTX8 ADC (singlet)^{Entries 5957}Mean 151.7_{RMS 45.48}

CFTX8 ADC (singlet)

0 50 100 150 200 250 300 0

20

40

60

80

100 CFTV4 ADC (singlet)^{Entries 6579}Mean 114.8_{RMS 48}

CFTV4 ADC (singlet)

Cft ADC (doublet low) (Clusters on muons)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 CFTX1 ADC (doublet low)^{Entries 6255}

Mean 118.3 RMS 49.19

CFTX1 ADC (doublet low)

0 50 100 150 200 250 300 0 10 20 30 40 50 60 70 80 90 CFTU1 ADC (doublet low)^{Entries 5757}_{Mean 86.24}

RMS 44.91

CFTU1 ADC (doublet low)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 CFTX2 ADC (doublet low)^{Entries 6623}_{Mean 122.6}

RMS 49.27

CFTX2 ADC (doublet low)

0 50 100 150 200 250 300 0 10 20 30 40 50 60 70 80 CFTV1 ADC (doublet low)^{Entries 5936}

Mean 91.57 RMS 46.06

CFTV1 ADC (doublet low)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 CFTX3 ADC (doublet low)^{Entries 6648}

Mean 117.4 RMS 49.51

CFTX3 ADC (doublet low)

0 50 100 150 200 250 300 0

20

40

60

80

100 CFTU2 ADC (doublet low)^{Entries 6119}_{Mean 91.03}

RMS 45.36

CFTU2 ADC (doublet low)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 CFTX4 ADC (doublet low)^{Entries 6809}_{Mean 115.7}

RMS 49.04

CFTX4 ADC (doublet low)

0 50 100 150 200 250 300 0 10 20 30 40 50 60 70 80 CFTV2 ADC (doublet low)^{Entries 6247}

Mean 90.15 RMS 45.51

CFTV2 ADC (doublet low)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 CFTX5 ADC (doublet low)^{Entries 6642}

Mean 114.8 RMS 48.97

CFTX5 ADC (doublet low)

0 50 100 150 200 250 300 0 10 20 30 40 50 60 70 80 CFTU3 ADC (doublet low)^{Entries 6206}_{Mean 93.64}

RMS 45.44

CFTU3 ADC (doublet low)

0 50 100 150 200 250 300 0 20 40 60 80 100 CFTX6 ADC (doublet low)^{Entries 6286}_{Mean 115.3}

RMS 48.47

CFTX6 ADC (doublet low)

0 50 100 150 200 250 300 0 10 20 30 40 50 60 70 80 CFTV3 ADC (doublet low)^{Entries 5470}

Mean 88.89 RMS 43.22

CFTV3 ADC (doublet low)

0 50 100 150 200 250 300 0 10 20 30 40 50 60 70 80 CFTX7 ADC (doublet low)^{Entries 5962}

Mean 109.4 RMS 46.27

CFTX7 ADC (doublet low)

0 50 100 150 200 250 300 0 10 20 30 40 50 60 70 80 90 CFTU4 ADC (doublet low)^{Entries 5312}Mean 85.43

RMS 41.4

CFTU4 ADC (doublet low)

0 50 100 150 200 250 300 0

20

40

60

80

100 CFTX8 ADC (doublet low)^{Entries 6709}Mean 111.9

RMS 48.22

CFTX8 ADC (doublet low)

0 50 100 150 200 250 300 0

20

40

60

80

100 CFTV4 ADC (doublet low)^{Entries 6118}

Mean 84.55 RMS 40.58

CFTV4 ADC (doublet low)

Cft ADC (doublet high) (Clusters on muons)

0 50 100 150 200 250 300 0 50 100 150 200 250 300 350 CFTX1 ADC (doublet high)

Entries 6255 Mean 168.8 RMS 35.28

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 CFTU1 ADC (doublet high)

Entries 5757 Mean 137.2 RMS 46.5

0 50 100 150 200 250 300 0 50 100 150 200 250 300

CFTX2 ADC (doublet high)

Entries 6623 Mean 171.7 RMS 32.74

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 160 CFTV1 ADC (doublet high)

Entries 5936 Mean 142.6 RMS 46.2

0 50 100 150 200 250 300 0 50 100 150 200 250 300 CFTX3 ADC (doublet high)

Entries 6648 Mean 168.6 RMS 35.8

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 160 180 CFTU2 ADC (doublet high)

Entries 6119 Mean 141 RMS 46.06

0 50 100 150 200 250 300 0 50 100 150 200 250 300 350 CFTX4 ADC (doublet high)

Entries 6809 Mean 166.5 RMS 35.65

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 160 CFTV2 ADC (doublet high)

Entries 6247 Mean 142.1 RMS 45.77

0 50 100 150 200 250 300 0 50 100 150 200 250 300 350 CFTX5 ADC (doublet high)

Entries 6642 Mean 167 RMS 37.48

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 160 180 CFTU3 ADC (doublet high)

Entries 6206 Mean 145.2 RMS 45.75

0 50 100 150 200 250 300 0 50 100 150 200 250 300 CFTX6 ADC (doublet high)

Entries 6286 Mean 166.5 RMS 37.25

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 CFTV3 ADC (doublet high)

Entries 5470 Mean 139.1 RMS 46.47

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 160 180 200 220 240 CFTX7 ADC (doublet high)

Entries 5962 Mean 162.1 RMS 38.09

0 50 100 150 200 250 300 0

20

40

60

80

100 CFTU4 ADC (doublet high)

Entries 5312 Mean 134 RMS 46.1

0 50 100 150 200 250 300 0 50 100 150 200 250 300 CFTX8 ADC (doublet high)

Entries 6709 Mean 164 RMS 38.15

0 50 100 150 200 250 300 0 20 40 60 80 100 120 CFTV4 ADC (doublet high)

Entries 6118 Mean 133.5 RMS 46.03

Cft ADC (doublet sum) (Clusters on muons)

0 100 200 300 400 500 600 0 20 40 60 80 100 120 140 CFTX1 ADC (doublet sum)

Entries 6255 Mean 287.1 RMS 74.15

0 100 200 300 400 500 600 0 10 20 30 40 50 60 CFTU1 ADC (doublet sum)

Entries 5757 Mean 223.5 RMS 81.99

0 100 200 300 400 500 600 0 20 40 60 80 100 120 140 160 CFTX2 ADC (doublet sum)

Entries 6623 Mean 294.3 RMS 72.14

0 100 200 300 400 500 600 0 10 20 30 40 50 60 70 CFTV1 ADC (doublet sum)

Entries 5936 Mean 234.2 RMS 82.78

0 100 200 300 400 500 600 0 20 40 60 80 100 120 CFTX3 ADC (doublet sum)

Entries 6648 Mean 286.1 RMS 74.86

0 100 200 300 400 500 600 0 10 20 30 40 50 60 CFTU2 ADC (doublet sum)

Entries 6119 Mean 232 RMS 82.49

0 100 200 300 400 500 600 0 20 40 60 80 100 120 140 CFTX4 ADC (doublet sum)

Entries 6809 Mean 282.2 RMS 74.52

0 100 200 300 400 500 600 0 10 20 30 40 50 60 70 80 CFTV2 ADC (doublet sum)

Entries 6247 Mean 232.3 RMS 81.72

0 100 200 300 400 500 600 0 20 40 60 80 100

CFTX5 ADC (doublet sum)

Entries 6642 Mean 281.8 RMS 76.2

0 100 200 300 400 500 600 0 10 20 30 40 50 60 CFTU3 ADC (doublet sum)

Entries 6206 Mean 238.9 RMS 81.66

0 100 200 300 400 500 600 0 20 40 60 80 100 CFTX6 ADC (doublet sum)

Entries 6286 Mean 281.7 RMS 75.62

0 100 200 300 400 500 600 0 10 20 30 40 50 60

CFTV3 ADC (doublet sum)

Entries 5470 Mean 228 RMS 80.62

0 100 200 300 400 500 600 0 10 20 30 40 50 60 70 80 CFTX7 ADC (doublet sum)

Entries 5962 Mean 271.5 RMS 74.09

0 100 200 300 400 500 600 0 10 20 30 40 50 60 CFTU4 ADC (doublet sum)

Entries 5312 Mean 219.4 RMS 78.75

0 100 200 300 400 500 600 0 20 40 60 80 100

CFTX8 ADC (doublet sum)

Entries 6709 Mean 275.9 RMS 76.01

0 100 200 300 400 500 600 0 10 20 30 40 50 60 70 80^{CFTV4 ADC (doublet sum)}

Entries 6118 Mean 218 RMS 77.64

CFTV4 ADC (doublet sum)

Cft ADC (all sector 2) (Clusters on muons)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 160 180 200 CFTX1 ADC (all sector 2)^{Entries 3327}

Mean 152.8 RMS 46.1

CFTX1 ADC (all sector 2)

0 50 100 150 200 250 300 0 10 20 30 40 50 60 70 80 CFTU1 ADC (all sector 2)^{Entries 2952}_{Mean 116.9}

RMS 51.97

CFTU1 ADC (all sector 2)

0 50 100 150 200 250 300 0 20 40 60 80 100 120 140 CFTX2 ADC (all sector 2)^{Entries 3185}_{Mean 149.1}

RMS 47.73

CFTX2 ADC (all sector 2)

0 50 100 150 200 250 300 0 10 20 30 40 50

CFTV1 ADC (all sector 2)^{Entries 2856}_{Mean 113.6}

RMS 51.67

CFTV1 ADC (all sector 2)

0 50 100 150 200 250 300

0

20

40

60

80

100

120

CFTX3 ADC (all sector 2)

Entries 3205

Mean 140.9

RMS 49.48

0 50 100 150 200 250 300

0

10

20

30

40

50

CFTU2 ADC (all sector 2)

Entries 2892

Mean 119.8

RMS 50.35

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

160

CFTX4 ADC (all sector 2)

Entries 3163

Mean 146.7

RMS 48.09

0 50 100 150 200 250 300

0

5

10

15

20

25

30

35

40

45

CFTV2 ADC (all sector 2)

Entries 2798

Mean 116.8

RMS 51.53

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

90

CFTX5 ADC (all sector 2)

Entries 2956

Mean 139.6

RMS 50.62

0 50 100 150 200 250 300

0

10

20

30

40

50

60

CFTU3 ADC (all sector 2)

Entries 2779

Mean 119.8

RMS 50.29

0 50 100 150 200 250 300

0

20

40

60

80

100

CFTX6 ADC (all sector 2)

Entries 2812

Mean 143.8

RMS 48.7

0 50 100 150 200 250 300

0

5

10

15

20

25

30

CFTV3 ADC (all sector 2)

Entries 2544

Mean 105.7

RMS 48.14

0 50 100 150 200 250 300

0

20

40

60

80

100

CFTX7 ADC (all sector 2)

Entries 2716

Mean 143.4

RMS 48.56

0 50 100 150 200 250 300

0

5

10

15

20

25

30

35

40

45

CFTU4 ADC (all sector 2)

Entries 2521

Mean 113.1

RMS 49.66

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

90

CFTX8 ADC (all sector 2)

Entries 2711

Mean 143.9

RMS 49.83

0 50 100 150 200 250 300

0

5

10

15

20

25

30

CFTV4 ADC (all sector 2)

Entries 2491

Mean 105.7

RMS 47.65

Cft ADC (all not sector 2) (Clusters on muons)

0 50 100 150 200 250 300

0

200

400

600

800

1000

CFTX1 ADC (all not sector 2)

Entries 24300

Mean 148.5

RMS 48.85

0 50 100 150 200 250 300

0

100

200

300

400

500

CFTU1 ADC (all not sector 2)

Entries 23377

Mean 116.9

RMS 52.76

0 50 100 150 200 250 300

0

100

200

300

400

500

600

700

800

900

CFTX2 ADC (all not sector 2)

Entries 23051

Mean 152.6

RMS 47.04

0 50 100 150 200 250 300

0

50

100

150

200

250

300

350

400

CFTV1 ADC (all not sector 2)

Entries 22039

Mean 122.4

RMS 52.62

0 50 100 150 200 250 300

0

100

200

300

400

500

600

700

800

900

CFTX3 ADC (all not sector 2)

Entries 23618

Mean 148.6

RMS 49.02

0 50 100 150 200 250 300

0

50

100

150

200

250

300

350

400

450

CFTU2 ADC (all not sector 2)

Entries 23160

Mean 120.4

RMS 52.54

0 50 100 150 200 250 300

0

100

200

300

400

500

600

700

800

CFTX4 ADC (all not sector 2)

Entries 22915

Mean 146

RMS 48.77

0 50 100 150 200 250 300

0

50

100

150

200

250

300

350

CFTV2 ADC (all not sector 2)

Entries 22414

Mean 120.4

RMS 52.71

0 50 100 150 200 250 300

0

100

200

300

400

500

600

700

800

900

CFTX5 ADC (all not sector 2)

Entries 21946

Mean 147

RMS 49.45

0 50 100 150 200 250 300

0

50

100

150

200

250

300

350

400

CFTU3 ADC (all not sector 2)

Entries 21355

Mean 123.9

RMS 52.26

0 50 100 150 200 250 300

0

100

200

300

400

500

600

700

CFTX6 ADC (all not sector 2)

Entries 20437

Mean 147.2

RMS 48.82

0 50 100 150 200 250 300

0

50

100

150

200

250

300

350

CFTV3 ADC (all not sector 2)

Entries 19671

Mean 119.7

RMS 51.7

0 50 100 150 200 250 300

0

100

200

300

400

500

CFTX7 ADC (all not sector 2)

Entries 19526

Mean 141.2

RMS 49.23

0 50 100 150 200 250 300

0

50

100

150

200

250

CFTU4 ADC (all not sector 2)

Entries 18824

Mean 113.3

RMS 50.56

0 50 100 150 200 250 300

0

100

200

300

400

500

600

700

CFTX8 ADC (all not sector 2)

Entries 20174

Mean 142.8

RMS 49.79

0 50 100 150 200 250 300

0

50

100

150

200

250

300

CFTV4 ADC (all not sector 2)

Entries 19804

Mean 113.5

RMS 50.24

Cft ADC (singlet sector 2) (Clusters on muons)

0 50 100 150 200 250 300

0

10

20

30

40

50

CFTX1 ADC (singlet sector 2)

Entries 743

Mean 160.2

RMS 41.24

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

CFTU1 ADC (singlet sector 2)

Entries 761

Mean 113.7

RMS 48.15

0 50 100 150 200 250 300

0

5

10

15

20

25

30

35

CFTX2 ADC (singlet sector 2)

Entries 733

Mean 155.5

RMS 42.72

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

CFTV1 ADC (singlet sector 2)

Entries 767

Mean 114.4

RMS 48.45

0 50 100 150 200 250 300

0

5

10

15

20

25

30

CFTX3 ADC (singlet sector 2)

Entries 816

Mean 147.6

RMS 45.37

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

CFTU2 ADC (singlet sector 2)

Entries 772

Mean 122.7

RMS 47.72

0 50 100 150 200 250 300

0

5

10

15

20

25

30

35

CFTX4 ADC (singlet sector 2)

Entries 781

Mean 155.7

RMS 41.9

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

CFTV2 ADC (singlet sector 2)

Entries 868

Mean 120.1

RMS 49.58

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

18

20

22

24

CFTX5 ADC (singlet sector 2)

Entries 785

Mean 145.1

RMS 48.09

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

18

20

22

CFTU3 ADC (singlet sector 2)

Entries 770

Mean 125.6

RMS 47.62

0 50 100 150 200 250 300

0

5

10

15

20

25

30

35

40

45

CFTX6 ADC (singlet sector 2)

Entries 835

Mean 153.8

RMS 44.04

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

CFTV3 ADC (singlet sector 2)

Entries 900

Mean 108.8

RMS 45.51

0 50 100 150 200 250 300

0

5

10

15

20

25

30

35

CFTX7 ADC (singlet sector 2)

Entries 780

Mean 152.3

RMS 44.36

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

18

20

22

CFTU4 ADC (singlet sector 2)

Entries 874

Mean 117.2

RMS 47.63

0 50 100 150 200 250 300

0

5

10

15

20

25

CFTX8 ADC (singlet sector 2)

Entries 693

Mean 151.3

RMS 46.45

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

CFTV4 ADC (singlet sector 2)

Entries 798

Mean 106.5

RMS 45.81

Cft ADC (singlet not sector 2) (Clusters on muons)

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

160

180

200

CFTX1 ADC (singlet not sector 2)

Entries 5624

Mean 155.5

RMS 43.93

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

90

CFTU1 ADC (singlet not sector 2)

Entries 6198

Mean 116.1

RMS 49.78

0 50 100 150 200 250 300

0

50

100

150

200

250

CFTX2 ADC (singlet not sector 2)

Entries 5578

Mean 161.4

RMS 41.16

0 50 100 150 200 250 300

0

20

40

60

80

100

120

CFTV1 ADC (singlet not sector 2)

Entries 6275

Mean 123.9

RMS 50.33

0 50 100 150 200 250 300

0

50

100

150

200

250

CFTX3 ADC (singlet not sector 2)

Entries 5618

Mean 155.8

RMS 44.47

0 50 100 150 200 250 300

0

20

40

60

80

100

CFTU2 ADC (singlet not sector 2)

Entries 6147

Mean 120.4

RMS 50.09

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

160

180

200

220

CFTX4 ADC (singlet not sector 2)

Entries 5652

Mean 154.7

RMS 43.8

0 50 100 150 200 250 300

0

20

40

60

80

100

CFTV2 ADC (singlet not sector 2)

Entries 6136

Mean 121.5

RMS 50.67

0 50 100 150 200 250 300

0

50

100

150

200

250

CFTX5 ADC (singlet not sector 2)

Entries 5764

Mean 154.5

RMS 44.89

0 50 100 150 200 250 300

0

20

40

60

80

100

120

CFTU3 ADC (singlet not sector 2)

Entries 6183

Mean 125.8

RMS 50.18

0 50 100 150 200 250 300

0

50

100

150

200

250

CFTX6 ADC (singlet not sector 2)

Entries 6162

Mean 156.5

RMS 43.89

0 50 100 150 200 250 300

0

20

40

60

80

100

120

CFTV3 ADC (singlet not sector 2)

Entries 6697

Mean 122.3

RMS 50.25

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

160

180

200

CFTX7 ADC (singlet not sector 2)

Entries 6143

Mean 149.8

RMS 45.71

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

90

CFTU4 ADC (singlet not sector 2)

Entries 6789

Mean 114.6

RMS 49.46

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

160

180

200

CFTX8 ADC (singlet not sector 2)

Entries 5264

Mean 151.8

RMS 45.35

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

90

CFTV4 ADC (singlet not sector 2)

Entries 5781

Mean 115.9

RMS 48.18

Cft ADC (doublet low sector 2) (Clusters on muons)

0 50 100 150 200 250 300

0

5

10

15

20

25

30

CFTX1 ADC (doublet low sector 2)

Entries 798

Mean 124.8

RMS 49.42

0 50 100 150 200 250 300

0

2

4

6

8

10

CFTU1 ADC (doublet low sector 2)

Entries 651

Mean 85.61

RMS 45.01

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

18

20

22

CFTX2 ADC (doublet low sector 2)

Entries 820

Mean 119.9

RMS 48.66

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

CFTV1 ADC (doublet low sector 2)

Entries 692

Mean 81.42

RMS 40.73

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

CFTX3 ADC (doublet low sector 2)

Entries 774

Mean 109.6

RMS 47.59

0 50 100 150 200 250 300

0

2

4

6

8

10

12

CFTU2 ADC (doublet low sector 2)

Entries 702

Mean 89.45

RMS 42.43

0 50 100 150 200 250 300

0

5

10

15

20

25

CFTX4 ADC (doublet low sector 2)

Entries 806

Mean 118.3

RMS 49.85

0 50 100 150 200 250 300

0

2

4

6

8

10

CFTV2 ADC (doublet low sector 2)

Entries 676

Mean 86.43

RMS 43.68

0 50 100 150 200 250 300

0

2

4

6

8

10

12

CFTX5 ADC (doublet low sector 2)

Entries 809

Mean 108.3

RMS 48.14

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

CFTU3 ADC (doublet low sector 2)

Entries 718

Mean 87.15

RMS 40.12

0 50 100 150 200 250 300

0

2

4

6

8

10

12

CFTX6 ADC (doublet low sector 2)

Entries 754

Mean 109.6

RMS 46.5

0 50 100 150 200 250 300

0

2

4

6

8

10

12

CFTV3 ADC (doublet low sector 2)

Entries 619

Mean 75.21

RMS 35.83

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

CFTX7 ADC (doublet low sector 2)

Entries 768

Mean 110.9

RMS 47.39

0 50 100 150 200 250 300

0

2

4

6

8

10

12

CFTU4 ADC (doublet low sector 2)

Entries 634

Mean 82.39

RMS 39.31

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

CFTX8 ADC (doublet low sector 2)

Entries 824

Mean 112.3

RMS 47.74

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

CFTV4 ADC (doublet low sector 2)

Entries 668

Mean 78.26

RMS 36.15

Cft ADC (doublet low not sector 2) (Clusters on muons)

0 50 100 150 200 250 300

0

20

40

60

80

100

CFTX1 ADC (doublet low not sector 2)

Entries 5457

Mean 117.3

RMS 49.09

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

CFTU1 ADC (doublet low not sector 2)

Entries 5106

Mean 86.32

RMS 44.9

0 50 100 150 200 250 300

0

20

40

60

80

100

120

CFTX2 ADC (doublet low not sector 2)

Entries 5803

Mean 123

RMS 49.35

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

CFTV1 ADC (doublet low not sector 2)

Entries 5244

Mean 92.91

RMS 46.55

0 50 100 150 200 250 300

0

20

40

60

80

100

CFTX3 ADC (doublet low not sector 2)

Entries 5874

Mean 118.5

RMS 49.67

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

90

CFTU2 ADC (doublet low not sector 2)

Entries 5417

Mean 91.23

RMS 45.72

0 50 100 150 200 250 300

0

20

40

60

80

100

120

CFTX4 ADC (doublet low not sector 2)

Entries 6003

Mean 115.3

RMS 48.91

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

CFTV2 ADC (doublet low not sector 2)

Entries 5571

Mean 90.61

RMS 45.71

0 50 100 150 200 250 300

0

20

40

60

80

100

CFTX5 ADC (doublet low not sector 2)

Entries 5833

Mean 115.7

RMS 49.02

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

CFTU3 ADC (doublet low not sector 2)

Entries 5488

Mean 94.49

RMS 46.02

0 50 100 150 200 250 300

0

20

40

60

80

100

CFTX6 ADC (doublet low not sector 2)

Entries 5532

Mean 116

RMS 48.68

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

CFTV3 ADC (doublet low not sector 2)

Entries 4851

Mean 90.64

RMS 43.77

0 50 100 150 200 250 300

0

10

20

30

40

50

60

CFTX7 ADC (doublet low not sector 2)

Entries 5194

Mean 109.2

RMS 46.1

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

CFTU4 ADC (doublet low not sector 2)

Entries 4678

Mean 85.84

RMS 41.65

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

90

CFTX8 ADC (doublet low not sector 2)

Entries 5885

Mean 111.8

RMS 48.29

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

90

CFTV4 ADC (doublet low not sector 2)

Entries 5450

Mean 85.32

RMS 41.02

Cft ADC (doublet high sector 2) (Clusters on muons)

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

CFTX1 ADC (doublet high sector 2)

Entries 798

Mean 173.1

RMS 29.64

0 50 100 150 200 250 300

0

5

10

15

20

25

30

CFTU1 ADC (doublet high sector 2)

Entries 651

Mean 138.8

RMS 43.94

0 50 100 150 200 250 300

0

5

10

15

20

25

30

35

40

CFTX2 ADC (doublet high sector 2)

Entries 820

Mean 169.1

RMS 34.2

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

18

20

22

CFTV1 ADC (doublet high sector 2)

Entries 692

Mean 135.5

RMS 46.3

0 50 100 150 200 250 300

0

10

20

30

40

50

CFTX3 ADC (doublet high sector 2)

Entries 774

Mean 162.6

RMS 37.62

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

18

CFTU2 ADC (doublet high sector 2)

Entries 702

Mean 140.2

RMS 43.8

0 50 100 150 200 250 300

0

10

20

30

40

50

60

CFTX4 ADC (doublet high sector 2)

Entries 806

Mean 166.2

RMS 35.07

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

18

CFTV2 ADC (doublet high sector 2)

Entries 676

Mean 137.6

RMS 46.31

0 50 100 150 200 250 300

0

5

10

15

20

25

30

35

CFTX5 ADC (doublet high sector 2)

Entries 809

Mean 161.6

RMS 39.78

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

18

20

22

CFTU3 ADC (doublet high sector 2)

Entries 718

Mean 141.6

RMS 43.99

0 50 100 150 200 250 300

0

5

10

15

20

25

30

35

CFTX6 ADC (doublet high sector 2)

Entries 754

Mean 163.9

RMS 36.85

0 50 100 150 200 250 300

0

2

4

6

8

10

12

CFTV3 ADC (doublet high sector 2)

Entries 619

Mean 126.2

RMS 46.46

0 50 100 150 200 250 300

0

10

20

30

40

50

CFTX7 ADC (doublet high sector 2)

Entries 768

Mean 166.2

RMS 34.5

0 50 100 150 200 250 300

0

2

4

6

8

10

12

14

16

CFTU4 ADC (doublet high sector 2)

Entries 634

Mean 133.4

RMS 44.11

0 50 100 150 200 250 300

0

5

10

15

20

25

30

35

40

45

CFTX8 ADC (doublet high sector 2)

Entries 824

Mean 165.9

RMS 37.58

0 50 100 150 200 250 300

0

2

4

6

8

10

12

CFTV4 ADC (doublet high sector 2)

Entries 668

Mean 126.4

RMS 44.72

Cft ADC (doublet high not sector 2) (Clusters on muons)

0 50 100 150 200 250 300

0

50

100

150

200

250

300

CFTX1 ADC (doublet high not sector 2)

Entries 5457

Mean 168.2

RMS 35.99

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

CFTU1 ADC (doublet high not sector 2)

Entries 5106

Mean 137

RMS 46.81

0 50 100 150 200 250 300

0

50

100

150

200

250

300

CFTX2 ADC (doublet high not sector 2)

Entries 5803

Mean 172.1

RMS 32.51

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

160

CFTV1 ADC (doublet high not sector 2)

Entries 5244

Mean 143.5

RMS 46.1

0 50 100 150 200 250 300

0

50

100

150

200

250

CFTX3 ADC (doublet high not sector 2)

Entries 5874

Mean 169.4

RMS 35.47

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

160

180

CFTU2 ADC (doublet high not sector 2)

Entries 5417

Mean 141.1

RMS 46.34

0 50 100 150 200 250 300

0

50

100

150

200

250

300

CFTX4 ADC (doublet high not sector 2)

Entries 6003

Mean 166.5

RMS 35.73

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

CFTV2 ADC (doublet high not sector 2)

Entries 5571

Mean 142.7

RMS 45.67

0 50 100 150 200 250 300

0

50

100

150

200

250

300

CFTX5 ADC (doublet high not sector 2)

Entries 5833

Mean 167.7

RMS 37.09

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

160

CFTU3 ADC (doublet high not sector 2)

Entries 5488

Mean 145.7

RMS 45.95

0 50 100 150 200 250 300

0

50

100

150

200

250

CFTX6 ADC (doublet high not sector 2)

Entries 5532

Mean 166.8

RMS 37.29

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

CFTV3 ADC (doublet high not sector 2)

Entries 4851

Mean 140.7

RMS 46.21

0 50 100 150 200 250 300

0

20

40

60

80

100

120

140

160

180

200

CFTX7 ADC (doublet high not sector 2)

Entries 5194

Mean 161.5

RMS 38.56

0 50 100 150 200 250 300

0

10

20

30

40

50

60

70

80

90

CFTU4 ADC (doublet high not sector 2)

Entries 4678

Mean 134.1

RMS 46.36

0 50 100 150 200 250 300

0

50

100

150

200

250

CFTX8 ADC (doublet high not sector 2)

Entries 5885

Mean 163.7

RMS 38.22

0 50 100 150 200 250 300

0

20

40

60

80

100

CFTV4 ADC (doublet high not sector 2)

Entries 5450

Mean 134.4

RMS 46.11