D(0)

D(1)

D(2)

D(3)

D(4)

D(5)

D(6)

D(7)

D(8)

D(9)

D(10)

D(11)

D(12)

D(13)

D(14)

D(15)

D(16)

D(17)

D(18)

D(19)

D(20)

D(21)

D(22)

D(23)

D(24)

D(25)

D(26)

D(27)

D(28)

D(29)

D(30)

D(31) VPC SN74ABTE16245

U1OE1DIR

2DIR

1A11A21A31A41A51A61A71A82A12A22A32A42A52A62A72A8VCCBIAS

1B11B21B31B41B51B61B71B82B12B22B32B42B52B62B72B812356891112131416171920222324252627293032333536373840414344464748SN74ABTE16245

U60OE1DIR

1B11B21B31B41B51B61B71B82B12B22B32B42B52B62B72B812356891112131416171920222324252627293032333536373840414344464748D(24)

AM27S19SA

10111213141512345679U35O0O1A0O2A1O3A2O4A3O5A4O6CSO7NTA(0)

NTA(1)

NTA(2)

NTA(3)

NTA(4)

NTA(16:0)TRACER

VMEbus Data Transceivers

ID PROM

BRD/EED/EES

Theresa M. Shaw CDF UPGRADE

ELECTRONICS

Fermi National Accelerator Lab

TMS-TRAC-071197-P4

4 of 176583174658REVSNDWG NO321ABDCA74BDCREVISIONS

APPROVED

DATE

DESCRIPTION REV SCALE

FSMC NO

DWG NO

SHEETD

SIZEID PROM

VME_D31

VME_D30

VME_D29

VME_D28

VME_D27

VME_D26

VME_D25

VME_D24

VME_D23

VME_D22

VME_D21

VME_D20

VME_D19

VME_D18

VME_D17

VME_D16

VME_D0

VME_D1

VME_D2

VME_D3

VME_D4

VME_D5

VME_D6

VME_D7

VME_D8

VME_D9

VME_D10

VME_D11

VME_D12

VME_D13

VME_D14

VME_D15

DATA_OE

VMEBUS_WRITE rd_idprom

D(31:0)

D(31:0)E:\JOBS_TRACER\TRACER_PROD_V2_1\vbdc\tracer.sbk(3;27) Mon Apr 12 09:07:20 1999