ObjectMon #2 TimeMonitor HADTDC Timing

Run:161634 Event: 742322 # of Events:18148 Time: Thu Apr 17 14:05:33 2003

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffCHA Entries 109882 Mean 1.64 RMS 0.7862

CHA: Eff. KS=0.71 (>0.01) GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

t0RawCHA

Entries 122594 Mean 568.2 RMS 7.082

CHA: Raw Time /ndf= 9.6 (<15) 2χ GOOD

Nent = 490490 0.01 ± Mean = 568 0.01 ± RMS = 6.8

Width [ns]

50 52 54 56 58 60 62

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

RawWidthCHA

Entries 122594 Mean 55.66 RMS 2.344

CHA: Hit Width

/ndf= 8.4 (<15) 2χ GOOD

Nent = 43883 0.01 ± Mean = 56 0.01 ± RMS = 2.2

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffPHA75 Entries 102101 Mean 5.607

RMS 2.547

PHA: Eff.

KS=3e-05 (<0.01) BAD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

7000

t0RawPHA

Entries 132841 Mean 562

RMS 6.871

PHA: Raw Time /ndf= 13 (<15) 2χ GOOD

Nent = 1.08504e+06 0.007 ± Mean = 562 0.007 ± RMS = 6.7

Width [ns]

50 55 60 65

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

RawWidthPHA

Entries 132841 Mean 57.28

RMS 2.814

PHA: Hit Width

/ndf= 1.6 (<15) 2χ GOOD

Nent = 28045 0.02 ± Mean = 57 0.02 ± RMS = 2.6

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 36618 Mean 1.658 RMS 0.775

WHA: Eff. KS= 1 (>0.01)

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

1600

1800

2000

t0RawWHA

Entries 42711 Mean 565.7 RMS 7.84

WHA: Raw Time /ndf= 2.7 (<15) 2χ GOOD

Nent = 340697 0.02 ± Mean = 565 0.01 ± RMS = 7.5

Width [ns]

50 55 60

Events

0 1000

2000

3000

4000

5000

6000

RawWidthWHA Entries 42711 Mean 54.27 RMS 2.868

WHA: Hit Width

/ndf= 2.4 (<15) 2χ GOOD

Nent = 35779 0.02 ± Mean = 54 0.01 ± RMS = 2.7