ObjectMon #92 MuonMonitor Slide Show

Run:185637 Event: 3897341 # of Events:29400 Time: Thu Jul 29 00:48:21 2004 Ref.Run:1852017

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400

Entries 17464

= 1.7 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 100 200 300 400 500

Entries 17464

Mean -1.411

= 1.4 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 500 1000

1500

2000

2500

Entries 17464 Mean -0.01059 RMS 8.638

=0.95 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

100

200

300

Entries 8616

= 1.5 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 500 1000

1500

2000

2500

3000

Entries 21622

Mean 0.0037

= 4.1 (> 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800 1000

Entries 8616 Mean 0.1894 RMS 11.72

= 1.9 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60 80 100 Entries 2741

= 1.4 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 50 100 150 200

Entries 2741

Mean 7.699

=0.75 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 100 200 300 400 500 600

Entries 2741 Mean -0.0518 RMS 11.62

= 1.4 (< 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

Run:185637 Event: 3897341 # of Events:29400 Time: Thu Jul 29 00:48:21 2004 Ref.Run:1852018

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

10

20 30

Entries 804

= 1.5 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 20 40 60 80 100

Entries 804

Mean -63.35

= 1.3 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 10 20 30 40 50 60

Entries 804 Mean 2.438 RMS 27.27

= 1.8 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 21622 Mean 2.357 RMS 1.527

= 44 (> 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

Run:185637 Event: 3897341 # of Events:29400 Time: Thu Jul 29 00:48:21 2004 Ref.Run:1852016

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400

Entries 17464 Mean 179.6 RMS 103.8

= 1.6 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 200 400 600 800 1000

Entries 17464 Mean -0.006044 RMS 0.3508

= 1.2 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 500 1000

1500

2000

2500

Entries 17464 Mean -0.01059 RMS 8.638

=0.95 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 50 100 150 200 250

Entries 8616 Mean 178.8 RMS 102.7

= 1.7 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 100 200 300 400 500 600

Entries 8616 Mean -0.0008706 RMS 0.3048

=0.85 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800 1000

Entries 8616 Mean 0.1894 RMS 11.72

= 1.9 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60 80

Entries 2741 Mean 167.5 RMS 106.2

= 1.2 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 50 100 150 200 250

Entries 2741 Mean 0.01789 RMS 0.867

=0.94 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 100 200 300 400 500 600

Entries 2741 Mean -0.0518 RMS 11.62

= 1.4 (< 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

Run:185637 Event: 3897341 # of Events:29400 Time: Thu Jul 29 00:48:21 2004 Ref.Run:1852017

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 21622 Mean 2.357 RMS 1.527

= 44 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 23252 Mean 0.9295 RMS 1.023

= 34 (> 3) 2χ Number of Muons