OPERA-3d

Post-Processor 7.03

6/Jul/2000 15:50:00 Page 45

UNITS

Length : cm Magn Flux Den: gauss Magnetic field : oersted Magn Scalar Pot: oersted-cm Magn Vector Pot: gauss-cm Elec Flux Den : C cm^{-2} Electric field : V cm^{-1} Conductivity : S cm^{-1} Current density : A cm^{-2} Power : W Force : N Energy : J

LOCAL COORDS. Xlocal = 0.0 Ylocal = 0.0 Zlocal = 0.0 Theta = 0.0 Phi = 0.0 Psi = 0.0

Local X coord Local Y coord Local Z coord

50.0 0.0 -200.0

50.0 0.0 -120.0

50.0 0.0 -40.0

50.0 0.0 40.0

50.0 0.0 120.0

50.0 0.0 200.0

-4000.0

-3000.0

-2000.0

-1000.0 0.0 1000.0

2000.0

3000.0

4000.0

Component: HX, Integral = 1.20508E-10

Component: HX, Integral = 1.20508E-10

Component: HX, Integral = 7.9126E-11

Component: HX, Integral = 1.93268E-11

Br vs s