Special Runs: TOF Through CLC Electronics

Ivan – Krešimir Furić

October 26, 2000

I. K. Furić, CDF II Commissioning Meeting, October 26, 2000

Goals:

• Understand tubes • See hits • Study occupancies • Match tracks to TOF hits • Reconstruction?

Pedestals for runs up to Run # 101256:

• pedestals at ∼ 50 counts, 110 counts wide • Uncorrelated • Hit = both ADC’s measure 600 or more counts

Timing issues:

• Events come in Myron Mode event 1 • Sometimes see charge spilling into event 2 • Δt offset by -5.3 ns • Hit = Δt_{corr} < 40ns

Timing issues:

Conclusions:

• analyzed half of one run (23880 Myron Mode events) • found 447 hits • mostly in Myron Mode event 1 • Tof is at least one event late