ObjectMon #2 TimeMonitor HADTDC Timing

Run:162399 Event: 755545 # of Events:17898 Time: Fri May 2 17:59:53 2003

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffCHA Entries 108266 Mean 1.644 RMS 0.7849

CHA: Eff. KS=0.97 (>0.01) GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

t0RawCHA

Entries 121155 Mean 568.4 RMS 7.096

CHA: Raw Time /ndf= 5.7 (<15) 2χ GOOD

Nent = 113146 0.02 ± Mean = 569 0.02 ± RMS = 6.7

Width [ns]

50 52 54 56 58 60 62

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

RawWidthCHA

Entries 121155 Mean 55.56 RMS 2.345

CHA: Hit Width

/ndf=0.53 (<15) 2χ GOOD

Nent = 61483 0.01 ± Mean = 56 0.008 ± RMS = 2.3

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffPHA75 Entries 102084 Mean 5.609

RMS 2.55

PHA: Eff. KS=0.14 (>0.01) GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

7000

t0RawPHA

Entries 131906 Mean 562.2

RMS 6.892

PHA: Raw Time /ndf= 3 (<15) 2χ GOOD

Nent = 140278 0.02 ± Mean = 562 0.02 ± RMS = 6.6

Width [ns]

50 55 60 65

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

RawWidthPHA

Entries 131906 Mean 57.29

RMS 2.794

PHA: Hit Width /ndf= 3 (<15) 2χ GOOD

Nent = 35434 0.01 ± Mean = 57 0.01 ± RMS = 2.4

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 35789 Mean 1.664 RMS 0.7729

WHA: Eff. KS= 1 (>0.01)

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

1600

1800

t0RawWHA

Entries 40883 Mean 566 RMS 7.843

WHA: Raw Time /ndf= 1.9 (<15) 2χ GOOD

Nent = 38785 0.05 ± Mean = 566 0.04 ± RMS = 7.3

Width [ns]

50 55 60

Events

0 1000

2000

3000

4000

5000

RawWidthWHA Entries 40883 Mean 54.2 RMS 2.828

WHA: Hit Width

/ndf=0.62 (<15) 2χ GOOD

Nent = 38065 0.02 ± Mean = 54 0.01 ± RMS = 2.6