0

500 1000

2000

3000

4000

5000

6000

8000

10000

12000

16000

20000

24000

28000

32000

36000

40000

44000

48000

52000

56000

60000

64000

68000

72000

76000

100

A=52

NDS 71, 659(1994)

Evaluator: Junde Huo

52 18Ar

Q_{β−}(14500)

0+ (3500) Sn

(21600) Sp

52 19K

Q_{β−}(16300)

105 ms β−

(2300) Sn

(17200) Sp

52 20Ca

Q_{β−}7900

0+ 4.6 s β−

4700 Sn n 91%

(17800) Sp

52 21Sc

Q_{β−}9080

3+ 8.2 s β−

5230 Sn

11780 Sp

52 22Ti

Q_{β−}1973

0+ 1.7 m β−

7808 Sn

13534 Sp

52 23V

Q_{β−}3975.4

3+ 3.743 m β−

7311.24 Sn 8999.5 Sp

52 24Cr 0+

10504.3 Sp 12039.4 Sn

52 25Mn

Q_{EC}4711.7

0 6+ 5.591 d EC

377.749

2+ 21.1 m EC 98.25%

IT1.75%

6545.4 Sp

10535.5 Sn

52 26Fe

Q_{EC}2372

0 0+ 8.275 h EC

6820

(12+) 45.9 s EC 7381 Sp

16183 Sn 52 27Co

Q_{EC}(14410)

18 ms EC

(990) Sp p 17%

(14710) Sn 52 28Ni

Q_{EC}(11260)

0+ 38 ms EC

(2670) Sp

(19300) Sn 52 29Cu

Q_{EC}(20000) Q_p(1500)