0

50

100

150

200

250

300

350

0 50 100 150 200 250 300 350 400

0

0.01

0.02

0.03

0.04

0.05

0.06

0 50 100 150 200 250 300 350 400

0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

0.05

-6 -4 -2 0 2 4 6

0

50

100

150

200

250

300

350

400

0 50 100 150 200 250 300 350 400

0

500

1000

1500

2000

2500

3000

3500

0 2 4 6 8 10

Entries Mean RMS 10000 4.815 1.308

0 250 500 750 1000

1250

1500

1750

2000

0 200 400 600 800 1000 1200

Entries Mean RMS 10000 679.8 58.93

0 20 40 60 80 100 120 140 160

0 200 400 600 800 1000 1200

Entries Mean RMS 8086 766.3 181.7