All Experimenters Meeting :

MiniBooNE

Heather Ray, Chris Green

hray@fnal.gov, greenc@fnal.gov

Los Alamos National Laboratory

H. Ray 8/2/2004–p.1/5

Standard Plot 1

H. Ray 8/2/2004–p.2/5

Standard Plot 2

H. Ray 8/2/2004–p.3/5

Weekend Horn Off Running

• Need Horn-Off measurements to tune MC • Limited H-O statistics from April running → behavior in energy peak not clear • ∼ doubled our H-O statistics • Planned for more H-O running in early 2005 • Also did 1 turn running for LMC : 4 special low intensity runs, study track ϵ

H. Ray 8/2/2004–p.4/5

Physics Plans to Shutdown

Full Horn Current

• 4 days of 1/3 current running (finish mapping horn current) • normal running until shutdown : ∼0.22x10^{20} total protons Full Current → Reduce b/c Tripping • 4 days of 1/3 current running • run at 2/3 current (increase current mapping stats, can include data set into osc. analysis) : ∼0.15x10^{20} equiv. protons • if trip at 2/3, reduce to 1/3 (increase current mapping stats, can include data set into osc. analysis) : ∼0.07x10^{20} equiv. protons Horn Off

• use data for specialized osc. search (sin^22θ=0.03, △m^2=0.3) • would see signal in horn-on mode, horn-off = cross check analysis

H. Ray 8/2/2004–p.5/5