Histograms in Run1250

10

10^2

10^3

0 25 50 75 100

Entries Mean RMS 15969 101.6 8.005

01/02/26 23.49

RS PMT Pedestal

1 10 10^2

250 500 750 1000

Constant 314.4 2.414 Mean 805.9 0.1494 Sigma 32.93 0.1471

RS PMT LED

10

10^2

0 25 50 75 100

Entries Mean RMS 2945 96.42 3.974

Ref PMT Pedestal

1 10 10^2

10^3

200 300 400 500

Constant 478.5 5.386 Mean 394.4 0.9481E-01 Sigma 10.32 0.7132E-01

Ref PMT YAlO

1 10 10^2

10^3

600 800 1000 1200

Constant 939.6 7.720 Mean 953.3 0.3724E-01 Sigma 11.17 0.5391E-01

Ref PMT LED

Histograms in Run1251

10

10^2

0 25 50 75 100

Entries Mean RMS 3104 100.5 7.943

01/02/26 23.49

RS PMT Pedestal

1 10 10^2

10^3

250 500 750 1000

Constant 463.4 3.423 Mean 585.9 0.1432 Sigma 23.63 0.9990E-01

RS PMT LED

1

10

10^2

0 25 50 75 100

Entries Mean RMS 3070 96.49 3.951

Ref PMT Pedestal

1 200 300 400 500

Constant 1.678 0.3864 Mean 285.5 7.510 Sigma 15.32 13.00

Ref PMT YAlO

1 10 10^2

10^3

600 800 1000 1200

Constant 1447. 12.97 Mean 615.6 0.1505E-01 Sigma 7.604 0.3453E-01

Ref PMT LED

Histograms in Run1252

1

10

10^2

0 25 50 75 100

Entries Mean RMS 5934 101.1 7.945

01/02/26 23.50

RS PMT Pedestal

1 10 10^2

250 500 750 1000

Constant 431.3 3.216 Mean 617.6 0.1083 Sigma 24.85 0.1051

RS PMT LED

10

10^2

0 25 50 75 100

Entries Mean RMS 3019 96.63 3.920

Ref PMT Pedestal

1

10

10^2

200 300 400 500

Constant 172.1 3.883 Mean 295.2 0.8812E-01 Sigma 6.668 0.8437E-01

Ref PMT YAlO

1 10 10^2

10^3

600 800 1000 1200

Constant 1343. 12.10 Mean 661.6 0.1779E-01 Sigma 8.064 0.3848E-01

Ref PMT LED