ObjectMon #2 TimeMonitor HADTDC Timing

Run:182411 Event: 4470824 # of Events:40200 Time: Wed May 5 22:24:39 2004 Ref.Run:182337

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 304191

CHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

Entries 332634 Mean 565.9 RMS 7.191

CHA: Raw Time /ndf= 1.9 (<22) 2χ GOOD

Width [ns]

50 55 60

Events

0 10000

20000

30000

40000

50000

Entries 332634 Mean 55.54 RMS 2.517

CHA: Hit Width

/ndf= 3.1 (<22) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 234161

PHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

Entries 291817 Mean 560.8 RMS 6.189

PHA: Raw Time /ndf= 2.2 (<21) 2χ GOOD

Width [ns]

50 55 60 65

Events

0 5000

10000

15000

20000

25000

30000

35000

40000

45000

Entries 291817 Mean 57.09 RMS 2.823

PHA: Hit Width

/ndf= 3.7 (<21) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 101142 Mean 1.685 RMS 0.7636

WHA: Eff. Eff. Check Ok GOOD

raw time [ns]

540 550 560 570 580

Events

0 1000

2000

3000

4000

5000

Entries 117371 Mean 563.6 RMS 8.148

WHA: Raw Time /ndf=0.91 (<17) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

RawWidthWHA Entries 117371 Mean 54.38 RMS 2.955

WHA: Hit Width /ndf= 1.9 (<17) 2χ GOOD