ObjectMon #2 TimeMonitor HADTDC Timing

Run:193399 Event: 1110746 # of Events:14707 Time: Mon Feb 7 11:37:17 2005 Ref.Run:191783

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 83992

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580 590

Events

0 1000

2000

3000

4000

5000

Entries 87416 Mean 569.1 RMS 7.215

CHA: Raw Time /ndf= 1 (<17) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

Entries 87416 Mean 55.47 RMS 2.619

CHA: Hit Width

/ndf= 9.4 (<17) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 101110

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

7000

8000

Entries 132550 Mean 561.9 RMS 5.969

PHA: Raw Time /ndf= 1.3 (<18) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

Entries 132550 Mean 56.93 RMS 2.675

PHA: Hit Width

/ndf= 3.6 (<18) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 26864 Mean 1.838 RMS 0.6823

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

Entries 28727 Mean 566.2 RMS 7.767

WHA: Raw Time /ndf= 1.2 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 500 1000

1500

2000

2500

3000

3500

4000

RawWidthWHA Entries 28727 Mean 54.27 RMS 2.663

WHA: Hit Width /ndf= 3 (<15) 2χ GOOD