Cell Id SVX Chip Status Map

Bulkhead, Phi Side Bulkhead, Z Side

Wedge #

Run 201607

Updated 09:42:17

No data! Failure! OK Checks Disabled

0 1 2 3 4 5 6 0 3 6 9 L0 0 1 2 3 4 5 6 0 3 6 9 L1 0 1 2 3 4 5 6 0 3 6 9 L2 0 1 2 3 4 5 6 0 3 6 9 L3

0 1 2 3 4 5 6 0 3 6 9 L4

0 1 2 3 4 5 6 0 3 6 9 0 1 2 3 4 5 6 0 3 6 9 0 1 2 3 4 5 6 0 3 6 9

0 1 2 3 4 5 6 0 3 6 9

0 1 2 3 4 5 6 0 3 6 9