                    [  Help : How to make this plot?  ]

(1) Select data: Click  "Select Data" -> "New" on the menu bar.
                 Select "non-image data" and 2 panels.
                 Click each panel number, then "Select CDF/Key Parameter".
                 Click "OK => Go Plot" to make a plot in default settings.

(2) Customize the plot:

    Click "Plot Control" on the main menu bar and then "Change Plot Settings".
    Select :
    1. "Overall Plot Settings" to change overall font size, etc.

    2. "Panel Layout and Positions" to change the panel locations.  
       First, change x coordinate values of all panels and then each y
       coordinate values.  A user can add a window grid on the top of the
       display window to locate the desired positions.
      
    3. "Axis Settings" -> "Axes: X, Y, and Z (color bar)" to change each X
       and Y axis settings such as labels, font sizes, tick marks, etc.
       To make a grid in each panel, simply specify that the tick lengths of
       both x and y axes equal 1.

    4. "Plot Styles" to change the plot styles for these 2 panels.


(3) Click "Plot Control" -> "Save" -> "GIF File" to save as GIF file.

(4) Click "Plot Control" -> "Create/Update a Plot File" to create a plot file
    for reuse.
