SVXMon L00 & ISL Chip Status Map

Bulkhead, Phi Side Bulkhead, Z Side

Wedge #

Run 152944

Updated 14:12:31

No data! Failure! OK Checks Disabled

0 1 2 3 4 5 6 0 18 0 3 6 9 L00 0 1 2 3 4 5 6 0

20

40

60

80

100

0 3 6 9 12 15 18 21 24 27

ISL0

0 1 2 3 4 5 6 0

20

40

60

80

100

120

140

0 3 6 9 12 15 18 21 24 27 30 33

ISL1

0 1 2 3 4 5 6 0 18 0 1 2 3 4 5 6 0

20

40

60

80

100

0 3 6 9 12 15 18 21 24 27 0 1 2 3 4 5 6 0

20

40

60

80

100

120

140

0 3 6 9 12 15 18 21 24 27 30 33