CLC: SloErr/Slope Summary for Run 149509

0

0.001

0.002

0.003

0.004

0.005

-1 x10

ADMEM

3 4 5 6 7 8 9 10

QIE

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 SloErr/Slope MEAN by QIE vs ADMEM

0 0.00050.0010.00150.0020.00250.0030.00350.0040.00450.005 -1 x10 0 1 2 3 4 5 6 7 8 Mean 0.0004035 RMS 3.426e-05

SloErr/Slope MEAN_{Mean 0.0004035}

0 10 20 30 40 50 60 70 80 90 0

0.001

0.002

0.003

0.004

0.005

0.006 -1 x10 SloErr/Slope MEAN vs channel number

0 10 20 30 40 50 60 70 80 90 0 0.001

0.002

0.003

0.004

0.005

0.006

0.007 -1 x10 RMS of SloErr/Slope vs channel number