18:00:00- 19:00:00- 20:00:00- 21:00:00- 22:00:00- 23:00:00- 00:00:00- 01:00:00- 02:00:00- 03:00:00- 04:00:00- 05:00:00- 06:00:00- 07:00:00- 08:00:00- 09:00:00- 10:00:00- 11:00:00- 12:00:00- 13:00:00- 14:00:00- 15:00:00- 16:00:00- 17:00:00- HKT ,LHZ Start Date:05/20/98 Filter: band-pass Displacement Magnification = 3000.00 @ 0.020 Hz

10.0min 20.0min 30.0min 40.0min 50.0min