ObjectMon #2 TimeMonitor HADTDC Timing

Run:162252 Event: 1820585 # of Events:53289 Time: Tue Apr 29 13:59:45 2003

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffCHA Entries 300741 Mean 1.644 RMS 0.7852

CHA: Eff. KS=0.46 (>0.01) GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

Entries 334345 Mean 568.6 RMS 7.084

CHA: Raw Time /ndf= 8.2 (<15) 2χ GOOD

Nent = 334345 0.01 ± Mean = 568 0.01 ± RMS = 6.8

Width [ns]

50 52 54 56 58 60 62

Events

0 10000

20000

30000

40000

50000

Entries 334345 Mean 55.56 RMS 2.348

CHA: Hit Width /ndf= 2 (<15) 2χ GOOD

Nent = 67400 0.01 ± Mean = 56 0.008 ± RMS = 2.3

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffPHA75 Entries 283126 Mean 5.614

RMS 2.551

PHA: Eff.

KS=0.00032 (<0.01) BAD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

Entries 365932 Mean 562.4 RMS 6.865

PHA: Raw Time /ndf= 5.3 (<15) 2χ GOOD

Nent = 365932 0.01 ± Mean = 563 0.01 ± RMS = 6.8

Width [ns]

50 55 60 65

Events

0 10000

20000

30000

40000

50000

60000

Entries 365932 Mean 57.33 RMS 2.779

PHA: Hit Width

/ndf= 19 (>15) 2χ BAD

Nent = 27804 0.02 ± Mean = 57 0.02 ± RMS = 2.5

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 100996 Mean 1.665 RMS 0.7724

WHA: Eff. KS=0.99 (>0.01) GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

Entries 115759 Mean 566.2 RMS 7.836

WHA: Raw Time /ndf= 2 (<15) 2χ GOOD

Nent = 115759 0.03 ± Mean = 566 0.02 ± RMS = 7.5

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

Entries 115759 Mean 54.24 RMS 2.852

WHA: Hit Width

/ndf= 2.9 (<15) 2χ GOOD

Nent = 40022 0.02 ± Mean = 54 0.01 ± RMS = 2.7