ϕ 0 1 2 3 4 5 6

Tag Rate

0 0.0002

0.0004

0.0006

0.0008

0.001

0.0012

0.0014

0.0016

0.0018

0.002

0.0022 -1 x10 phi_negneg_pred

Entries 100945 Mean 3.017 RMS 1.845 Underflow 0 Overflow 0 Integral 0.0008954

phi_negneg

Entries 100945 Mean 3.499 RMS 1.825 Underflow 0 Overflow 0 Integral 0.00128

ϕ 0 x10 (-- tags) ϕ