Summary of systematic uncertainties [in percent] for dσ/dM_{tt} measurement CDF II Preliminary, ∫ L ≈ 2.7 f b^{−1} M_{tt} [GeV /c^2] 0-350 350-400 400-450 450-500 500-550 550-600 600-700 700-800 800-1400 MC Gen. 0.7 2.4 5.3 5.7 4.6 3.3 1.4 0.0 1.0 ISR/FSR 1.5 1.3 0.8 0.2 1.1 2.1 2.0 2.2 3.3 Residual JES 7.1 5.9 3.9 2.5 1.4 2.2 4.5 7.2 8.7 b-jet JES 4.1 2.2 1.1 1.9 1.0 0.6 0.7 2.1 2.7 Back. Shape 0.4 0.3 0.6 0.6 0.4 0.4 0.8 1.3 1.8 Back. Norm. 10.3 7.4 2.3 1.6 3.0 4.0 4.4 4.9 5.1 Acceptance 4.5 4.4 4.3 4.4 4.6 4.6 4.4 4.0 3.8 PDF Set 7.7 6.1 3.0 1.0 4.8 9.3 14.0 17.4 18.8 Total 16.0 12.6 8.9 8.1 8.9 12.0 16.1 20.1 22.2