ObjectMon #2 TimeMonitor HADTDC Timing

Run:179642 Event: 696258 # of Events:6965 Time: Thu Mar 4 12:05:04 2004 Ref.Run:179505

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 64152

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 500 1000

1500

2000

2500

3000

3500

Entries 70812 Mean 565.6 RMS 7.118

CHA: Raw Time /ndf= 2 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

Entries 70812 Mean 55.5 RMS 2.543

CHA: Hit Width

/ndf= 1.5 (<15) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 52771

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570

Events

0 500 1000

1500

2000

2500

3000

3500

4000

Entries 66366 Mean 560.5 RMS 6.117

PHA: Raw Time /ndf= 2 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

Entries 66366 Mean 57.05 RMS 2.613

PHA: Hit Width

/ndf=0.92 (<15) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 22556 Mean 1.683 RMS 0.7655

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570 580

Events

0 200 400 600 800 1000

1200

Entries 26338 Mean 563.3 RMS 8.066

WHA: Raw Time /ndf= 1.7 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 500 1000

1500

2000

2500

3000

RawWidthWHA Entries 26338 Mean 54.35 RMS 2.924

WHA: Hit Width /ndf= 1.6 (<15) 2χ GOOD