What follows are 14 tables summarizing the exact value of the unsmearing correction factor K for every bin in the Dalitz plane, the value of (unsmeared “measured” – “true”) for that bin, and information about whether the theoretical uncertainty in that bin was < 20% (if so it was used in the analysis) or not.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.67 0.67 –0.024±0.19 0.93±0.067 no 0.69 0.65 0.23±0.28 1.02±0.083 no 0.69 0.67 –0.0017±0.11 0.91±0.037 yes 0.69 0.69 0.13±0.18 0.94±0.053 no 0.71 0.65 –0.20±0.099 0.94±0.044 yes 0.71 0.67 –0.14±0.094 0.93±0.037 yes 0.71 0.69 –0.18±0.089 0.96±0.039 yes 0.71 0.71 –0.065±0.14 0.92±0.050 no 0.73 0.63 0.45±0.30 0.97±0.077 no 0.73 0.65 0.16±0.12 0.89±0.035 no 0.73 0.67 –0.099±0.092 0.98±0.038 yes 0.73 0.69 0.013±0.10 0.92±0.036 yes 0.73 0.71 0.071±0.11 0.94±0.036 yes 0.73 0.73 –0.13±0.12 0.88±0.045 no 0.75 0.63 0.20±0.14 0.95±0.043 yes 0.75 0.65 –0.12±0.088 0.96±0.037 yes

Table 1: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.75 0.67 0.14±0.11 0.87±0.033 yes 0.75 0.69 0.25±0.12 0.87±0.033 yes 0.75 0.71 0.13±0.11 0.91±0.034 yes 0.75 0.73 –0.0093±0.097 0.95±0.034 yes 0.75 0.75 –0.058±0.13 0.95±0.048 no 0.77 0.61 0.36±0.29 0.86±0.064 no 0.77 0.63 –0.042±0.097 0.93±0.035 yes 0.77 0.65 0.028±0.10 0.92±0.034 yes 0.77 0.67 –0.0014±0.096 0.92±0.035 yes 0.77 0.69 0.097±0.10 0.92±0.033 yes 0.77 0.71 0.035±0.097 0.94±0.033 yes 0.77 0.73 –0.16±0.083 0.92±0.033 yes 0.77 0.75 0.042±0.096 0.94±0.032 yes 0.77 0.77 –0.038±0.12 0.97±0.045 no 0.79 0.61 –0.16±0.094 0.99±0.041 yes 0.79 0.63 –0.10±0.087 0.91±0.033 yes

Table 2: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.79 0.65 –0.020±0.093 0.92±0.033 yes 0.79 0.67 0.035±0.097 0.93±0.033 yes 0.79 0.69 –0.017±0.088 0.92±0.032 yes 0.79 0.71 –0.052±0.088 0.99±0.034 yes 0.79 0.73 –0.16±0.077 1.00±0.034 yes 0.79 0.75 –0.018±0.088 0.95±0.032 yes 0.79 0.77 0.11±0.092 0.94±0.031 yes 0.79 0.79 0.012±0.12 0.99±0.044 no 0.81 0.59 –0.29±0.13 0.93±0.066 no 0.81 0.61 0.19±0.11 0.94±0.033 yes 0.81 0.63 –0.042±0.086 0.96±0.034 yes 0.81 0.65 0.071±0.098 0.94±0.032 yes 0.81 0.67 –0.081±0.083 0.96±0.033 yes 0.81 0.69 –0.012±0.088 1.00±0.034 yes 0.81 0.71 0.087±0.098 0.93±0.031 yes 0.81 0.73 –0.031±0.084 1.02±0.033 yes

Table 3: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.81 0.75 0.064±0.090 0.95±0.030 yes 0.81 0.77 0.036±0.085 0.95±0.030 yes 0.81 0.79 0.053±0.086 0.92±0.028 yes 0.81 0.81 0.025±0.11 1.00±0.042 no 0.83 0.59 0.081±0.11 0.92±0.037 yes 0.83 0.61 –0.087±0.083 0.96±0.033 yes 0.83 0.63 –0.097±0.082 0.93±0.032 yes 0.83 0.65 –0.067±0.084 0.98±0.033 yes 0.83 0.67 0.066±0.095 0.89±0.030 yes 0.83 0.69 –0.095±0.080 0.96±0.032 yes 0.83 0.71 0.070±0.093 0.93±0.030 yes 0.83 0.73 0.099±0.093 0.94±0.030 yes 0.83 0.75 0.033±0.085 0.97±0.030 yes 0.83 0.77 0.061±0.086 0.94±0.029 yes 0.83 0.79 0.016±0.081 0.96±0.028 yes 0.83 0.81 –0.0024±0.074 0.96±0.028 yes

Table 4: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.83 0.83 0.17±0.12 0.99±0.038 no 0.85 0.57 –0.055±0.17 0.88±0.058 no 0.85 0.59 0.19±0.10 0.89±0.030 yes 0.85 0.61 0.028±0.088 0.96±0.031 yes 0.85 0.63 0.055±0.093 0.91±0.030 yes 0.85 0.65 0.16±0.10 0.97±0.032 yes 0.85 0.67 0.022±0.088 0.94±0.031 yes 0.85 0.69 –0.012±0.085 0.95±0.030 yes 0.85 0.71 –0.16±0.070 1.00±0.031 yes 0.85 0.73 –0.025±0.080 0.95±0.029 yes 0.85 0.75 –0.17±0.066 0.99±0.030 yes 0.85 0.77 0.044±0.081 0.97±0.029 yes 0.85 0.79 0.054±0.079 0.94±0.027 yes 0.85 0.81 –0.11±0.065 1.03±0.028 yes 0.85 0.83 0.056±0.078 0.97±0.026 yes 0.85 0.85 –0.080±0.091 1.01±0.037 no

Table 5: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.87 0.57 –0.14±0.086 0.98±0.036 yes 0.87 0.59 –0.085±0.078 0.96±0.030 yes 0.87 0.61 –0.046±0.080 0.94±0.030 yes 0.87 0.63 –0.094±0.075 0.94±0.030 yes 0.87 0.65 –0.065±0.077 1.01±0.032 yes 0.87 0.67 0.11±0.091 0.94±0.029 yes 0.87 0.69 0.068±0.086 0.98±0.029 yes 0.87 0.71 0.082±0.086 0.96±0.028 yes 0.87 0.73 0.18±0.090 0.88±0.026 yes 0.87 0.75 0.038±0.080 0.97±0.028 yes 0.87 0.77 0.059±0.080 0.97±0.027 yes 0.87 0.79 –0.055±0.069 1.03±0.028 yes 0.87 0.81 –0.087±0.066 0.98±0.026 yes 0.87 0.83 –0.085±0.065 0.99±0.026 yes 0.87 0.85 –0.061±0.064 1.01±0.026 yes 0.87 0.87 0.14±0.11 0.95±0.034 yes

Table 6: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.89 0.55 –0.0057±0.15 0.97±0.058 no 0.89 0.57 –0.016±0.080 0.96±0.029 yes 0.89 0.59 –0.071±0.075 0.97±0.029 yes 0.89 0.61 –0.072±0.075 0.98±0.029 yes 0.89 0.62 0.048±0.082 0.96±0.028 yes 0.89 0.65 –0.043±0.075 0.92±0.027 yes 0.89 0.67 –0.039±0.074 0.92±0.027 yes 0.89 0.69 0.017±0.078 0.94±0.027 yes 0.89 0.71 0.031±0.078 0.94±0.027 yes 0.89 0.73 –0.12±0.064 0.96±0.027 yes 0.89 0.75 –0.031±0.070 0.96±0.026 yes 0.89 0.77 –0.013±0.068 0.96±0.026 yes 0.89 0.79 –0.053±0.065 1.00±0.026 yes 0.89 0.81 0.11±0.076 0.99±0.026 yes 0.89 0.83 0.093±0.074 0.95±0.024 yes 0.89 0.85 –0.011±0.064 1.03±0.025 yes

Table 7: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.89 0.87 0.031±0.067 1.00±0.024 yes 0.89 0.89 –0.031±0.088 1.02±0.034 yes 0.91 0.55 0.0071±0.086 0.95±0.031 yes 0.91 0.57 0.040±0.076 0.96±0.027 yes 0.91 0.59 0.12±0.084 0.98±0.028 yes 0.91 0.61 –0.0092±0.073 0.93±0.026 yes 0.91 0.63 –0.14±0.063 0.99±0.027 yes 0.91 0.65 –0.010±0.072 0.97±0.026 yes 0.91 0.67 0.18±0.083 0.96±0.026 yes 0.91 0.69 0.10±0.078 0.91±0.024 yes 0.91 0.71 0.032±0.072 0.97±0.026 yes 0.91 0.73 0.0067±0.069 0.97±0.025 yes 0.91 0.75 –0.081±0.064 0.99±0.025 yes 0.91 0.77 –0.020±0.065 0.98±0.025 yes 0.91 0.79 0.058±0.071 0.93±0.023 yes 0.91 0.81 –0.013±0.064 1.01±0.025 yes

Table 8: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.91 0.83 –0.10±0.058 1.03±0.025 yes 0.91 0.85 0.048±0.068 1.03±0.025 yes 0.91 0.87 0.025±0.064 1.03±0.024 yes 0.91 0.89 –0.051±0.060 1.06±0.025 yes 0.91 0.91 –0.025±0.086 1.13±0.038 yes 0.93 0.53 0.066±0.16 1.01±0.056 no 0.93 0.55 0.12±0.080 0.90±0.025 yes 0.93 0.57 –0.11±0.064 1.01±0.027 yes 0.93 0.59 0.082±0.077 0.94±0.025 yes 0.93 0.61 0.021±0.071 0.94±0.025 yes 0.93 0.63 –0.11±0.063 1.02±0.027 yes 0.93 0.65 –0.043±0.066 0.96±0.025 yes 0.93 0.67 –0.050±0.062 0.94±0.024 yes 0.93 0.69 –0.0070±0.064 0.94±0.023 yes 0.93 0.71 –0.060±0.061 0.95±0.023 yes 0.93 0.73 0.10±0.072 0.96±0.023 yes

Table 9: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.93 0.75 –0.10±0.058 0.99±0.024 yes 0.93 0.77 0.086±0.068 0.97±0.023 yes 0.93 0.79 0.047±0.064 0.98±0.023 yes 0.93 0.81 –0.016±0.060 1.02±0.023 yes 0.93 0.83 0.029±0.062 1.02±0.023 yes 0.93 0.85 –0.062±0.058 1.02±0.023 yes 0.93 0.87 0.024±0.062 1.07±0.025 yes 0.93 0.89 0.12±0.070 1.12±0.026 yes 0.93 0.91 –0.0060±0.065 1.13±0.027 yes 0.93 0.93 0.037±0.093 1.13±0.040 yes 0.95 0.53 –0.0042±0.094 1.04±0.037 no 0.95 0.55 0.028±0.084 1.03±0.032 yes 0.95 0.57 0.056±0.084 1.02±0.031 no 0.95 0.59 0.0094±0.081 1.04±0.031 no 0.95 0.61 –0.014±0.077 1.03±0.030 yes 0.95 0.63 –0.032±0.075 1.07±0.031 yes

Table 10: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.95 0.65 –0.056±0.071 1.01±0.028 yes 0.95 0.67 –0.064±0.068 1.02±0.028 yes 0.95 0.69 0.027±0.072 1.05±0.028 yes 0.95 0.71 0.075±0.072 1.00±0.026 yes 0.95 0.73 0.0053±0.066 1.02±0.025 yes 0.95 0.75 –0.023±0.059 1.01±0.024 yes 0.95 0.77 0.038±0.062 1.00±0.023 yes 0.95 0.79 –0.0085±0.058 1.03±0.023 yes 0.95 0.81 –0.0033±0.057 1.03±0.023 yes 0.95 0.83 0.013±0.058 1.01±0.022 yes 0.95 0.85 –0.029±0.057 1.08±0.024 yes 0.95 0.87 0.0023±0.059 1.08±0.025 yes 0.95 0.89 –0.055±0.058 1.14±0.027 yes 0.95 0.91 0.017±0.066 1.20±0.030 yes 0.95 0.93 –0.080±0.064 1.21±0.033 yes 0.95 0.95 0.10±0.14 1.28±0.059 no

Table 11: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.97 0.51 –0.035±0.24 1.04±0.10 no 0.97 0.53 0.080±0.12 1.04±0.046 no 0.97 0.55 –0.072±0.11 1.11±0.050 no 0.97 0.57 –0.15±0.10 1.07±0.047 no 0.97 0.59 0.023±0.11 1.06±0.045 no 0.97 0.61 –0.031±0.10 1.06±0.045 no 0.97 0.63 –0.0021±0.11 1.01±0.04 no 0.97 0.65 –0.055±0.10 1.03±0.040 no 0.97 0.67 0.082±0.11 1.09±0.040 no 0.97 0.69 0.11±0.11 1.06±0.038 no 0.97 0.71 0.066±0.099 1.04±0.036 no 0.97 0.73 –0.13±0.076 1.04±0.034 no 0.97 0.75 0.017±0.084 1.04±0.033 no 0.97 0.77 0.025±0.080 1.07±0.033 yes 0.97 0.79 0.023±0.079 1.15±0.033 yes 0.97 0.81 –0.14±0.066 1.12±0.031 yes

Table 12: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.97 0.83 0.034±0.072 1.14±0.030 yes 0.97 0.85 –0.056±0.063 1.16±0.029 yes 0.97 0.87 0.048±0.069 1.15±0.028 yes 0.97 0.89 –0.037±0.063 1.22±0.030 yes 0.97 0.91 0.010±0.070 1.30±0.035 yes 0.97 0.93 –0.052±0.079 1.26±0.041 yes 0.97 0.95 0.058±0.12 1.24±0.055 no 0.97 0.97 0.13±0.31 1.32±0.13 no 0.99 0.51 –0.16±0.36 1.11±0.20 no 0.99 0.53 –0.086±0.33 1.16±0.16 no 0.99 0.55 0.27±0.50 1.09±0.15 no 0.99 0.57 0.32±0.45 1.03±0.14 no 0.99 0.59 0.14±0.35 1.07±0.14 no 0.99 0.61 –0.33±0.20 1.34±0.17 no 0.99 0.63 0.41±0.44 0.91±0.10 no 0.99 0.65 0.082±0.29 1.10±0.12 no

Table 13: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.

X_3 X_4 (Unsmeared–True)/True K σ_{NLO} < 0.2 0.99 0.67 0.32±0.33 1.17±0.12 no 0.99 0.69 –0.060±0.23 1.15±0.11 no 0.99 0.71 0.15±0.27 0.87±0.077 no 0.99 0.73 0.13±0.25 1.06±0.084 no 0.99 0.75 0.033±0.21 1.13±0.087 no 0.99 0.77 0.14±0.23 1.08±0.077 no 0.99 0.79 –0.0042±0.19 1.08±0.078 no 0.99 0.81 0.0029±0.18 1.01±0.069 no 0.99 0.83 0.035±0.18 1.18±0.074 no 0.99 0.85 –0.010±0.16 1.11±0.067 no 0.99 0.87 –0.14±0.13 1.25±0.072 no 0.99 0.89 –0.066±0.13 1.19±0.068 no 0.99 0.91 0.29±0.20 1.27±0.073 no 0.99 0.93 –0.014±0.15 1.30±0.081 no 0.99 0.95 –0.18±0.19 1.49±0.13 no 0.99 0.97 –0.11±0.49 1.44±0.32 no

Table 14: The fractional difference between the unsmeared measured and the true Dalitz distributions in every kinematically allowed bin in the Dalitz plane as a function of X_3 and X_4.