0

500 1000

2000

3000

4000

5000

6000

8000

10000

12000

16000

20000

24000

28000

32000

36000

40000

44000

48000

52000

56000

60000

64000

100

A=181

NDS 43, 289(1984) NDS 62, 101(1991)(U) (Revised 1992)

Evaluator: R.B. Firestone

181 70Yb

Q_{β−}(3900)

(4500) Sn

181 71Lu

Q_{β−}(2700)

(7/2+) 3.5 m β−

(6100) Sn (7600) Sp

181 72Hf

Q_{β−}1027

1/2^– 42.39 d β−

5695.7 Sn

8020 Sp

181 73Ta

7/2+

5941 Sp 7577.0 Sn

181 74W

Q_{EC}188

9/2+121.2 d EC

6607 Sp 6681 Sn

181 75Re

Q_{EC}1739

5/2+ 19.9 h EC

4160 Sp

8740 Sn

181 76Os

Q_{EC}2990

0 1/2^– 105 m EC

49.0

(7/2)^– 2.7 m EC

4970 Sp

(7200) Sn

185 78Pt

Q_α4540

9/2+ 70.9 m

α 0.0050%

181 77Ir

Q_{EC}4070

(5/2)^– 4.90 m EC

(2400) Sp

(9600) Sn

185 79Au

Q_α5181

5/2^– 4.25 m

α 0.26%

181 78Pt

Q_{EC}(5200)

1/2^– 51 s EC

Q_α5150

α ~0.06%

(3600) Sp

(8100) Sn

185 80Hg

Q_α5778

0 1/2^– 49.1 s

α 6%

99.3 13/2+ 21.6 s

α ~0.03%

181 79Au

Q_{EC}(6300)

5/2^– 11.4 s

EC_{98.7%}

Q_α5752

α 1.3%

(1000) Sp p α+ 9.0×10^{-6}%

0.014%-p

(10400) Sn

185 81Tl

Q_α(6100)

454 (9/2^–) 1.83 s

α

181 80Hg

Q_{EC}(7300)

1/2(^–) 3.6 s

EC_{64%}

Q_α6287

α 36%

(2200) Sp

(8600) Sn

185 82Pb

Q_α6680

4.1 s

α

181 81Tl

Q_{EC}(8500) Q_p(700) Q_α(6600)

(11100) Sn 181 82Pb 0

Q_{EC}(9100)

0+x (13/2+) ~50 ms

Q_α(7240)

α

(1200) Sp