Tracking Efficiency for 3 prong τs

Silke Duensing KU Nijmegen August 16, 2001

3 prong τ Samples (p09):

single τ , no MB /prj root/850/tauid 3/duensing/ track ineff/three prong single tau 1665ev.file /prj root/850/tauid 3/duensing/ track ineff/three prong single tau p094 2184ev.file

Different Steps

looked at chunks: 113 : r ϕ CFT 111 : central CFT 101 : central CFT 201 : central CFT combined with SMT 401 : final

about 17k tracks in ntuples 80% of MC track within acceptance

Chunk 401 201 101 111 113 matched 0.50 0.30 0.39 0.34 0.405 mc only 0.42 0.64 0.577 0.63 0.59 misreco 0.034 0.029 0.29 0.21 0.042 fakes 0.007 0.0006 0.0024 0.0008 0.002

Lost tracks

Efficiency curves