SumEt

Entries 7000

Mean 67.23

RMS 19.42

Underflow 0

Overflow 5

Integral 6995

0 50 100 150 200 250 0

200

400

600

800

1000

1200

1400

1600

SumEt of 4b’s w GRAPPA cut

0 20 40 60 80 100 120 140 0 5 10 15 20 25 30 35 40 45 50 Et_b4

Entries 7000 Mean x 53.14 Mean y 20.84 RMS x 13.69 RMS y 6.384 0 46 15 0 6939 0 0 0 0 Integral 6939

SumEt*.8 vs B4_Et*.8