UMICH serial number ____________

TDC Modification Rider - A

This rider should remain with this TDC until it has received all modifications and passed the go/ nogo test. It should then be removed and placed in Myron Campbell�s mailbox at PREP.

Modification Verified or Completed By Date

ECO-3 (Add two resistors) ECO-4 (Add one resistor) ECO-5 (Replace Q3 with CY960A)

�ECO-6� (Modify ECO-1, new PALS)

�ECO-7� (To be determined)

Post-Modification Tests

GO / NO GO Pass _______ Fail _______ Date _________ Initial ________

Reason for failure__________________________________________________________________

COMMENTS