UMICH serial number ____________

TDC Modification Rider - B

This rider should remain with this TDC through testing. Remove this sheet immediately before it is installed, finish filling it out, and leave it in the University of Michigan mailbox at CDF.

Pre-Installation Tests

TrackTest Pass _______ Fail _______ Date _________ Initial ________

Reason for failure__________________________________________________________________

MezzTest Pass ______ Fail ______ Date ________ Initial ________

Reason for failure__________________________________________________________________

Board Installation

Crate __________________________ Slot _____________________________

Mezzanine Type _________________ Mezzanine Serial Number __________

Post-Installation Tests

FinalTest Pass _______ Fail _______ Date _________ Initial ________

Reason for failure__________________________________________________________________