Average ToT: Source scan - ASSY 2. Module "512169"

Column

Row

6 8 10 12 14 16 18 20 22 24 26 Map of avg. raw TOT data

Constant 4646 Mean 14.91 Sigma 0.861

Average ToT

6 8 10 12 14 16 18 20 22 24 26 500 1000

1500

2000

2500

3000

3500

4000

4500

Average ToT distribution

"Channel" = row+160*column+2880*chip

0 5000 10000 15000 20000 25000 30000 35000 40000 45000

Average ToT

6 8 10 12 14 16 18 20 22 24 26 Average ToT scatter plot