\begin{thebibliography}{10}
\providecommand{\url}[1]{#1}
\csname url@rmstyle\endcsname
\providecommand{\newblock}{\relax}
\providecommand{\bibinfo}[2]{#2}
\providecommand\BIBentrySTDinterwordspacing{\spaceskip=0pt\relax}
\providecommand\BIBentryALTinterwordstretchfactor{4}
\providecommand\BIBentryALTinterwordspacing{\spaceskip=\fontdimen2\font plus
\BIBentryALTinterwordstretchfactor\fontdimen3\font minus
  \fontdimen4\font\relax}
\providecommand\BIBforeignlanguage[2]{{%
\expandafter\ifx\csname l@#1\endcsname\relax
\typeout{** WARNING: IEEEtran.bst: No hyphenation pattern has been}%
\typeout{** loaded for the language `#1'. Using the pattern for}%
\typeout{** the default language instead.}%
\else
\language=\csname l@#1\endcsname
\fi
#2}}

\bibitem{Bar-Cohen04}
Y.~Bar-Cohen, ``Electric flex,'' \emph{IEEE Spectrum}, vol.~41, no.~6, pp.
  29--33, 2004.

\bibitem{Shahinpoor01}
M.~Shahinpoor and K.~J. Kim, ``Ionic polymer-metal composites: I.
  fundamentals,'' \emph{Smart Materials and Structures}, vol.~10, pp. 819--833,
  2001.

\bibitem{Guo03}
S.~Guo, T.~Fukuda, and K.~Asaka, ``A new type of fish-like underwater
  microrobot,'' \emph{IEEE/ASME Transactions on Mechatronics}, vol.~8, no.~1,
  pp. 136--141, 2003.

\bibitem{Kim03}
B.~Kim, J.~Ryu, Y.~Jeong, Y.~Tak, B.~Kim, and J.-O. Park, ``A ciliary based
  8-legged walking micro robot using cast {IPMC} actuators,'' in
  \emph{Proceedings of {IEEE} International Conference on Robots and
  Automation}, 2003, pp. 2940--2945.

\bibitem{Guo95}
S.~Guo, T.~Fukuda, K.~Kosuge, F.~Arai, and M.~Negoro, ``Micro catheter system
  with active guide wire,'' in \emph{Proceedings of {IEEE} International
  Conference on Robotics and Automation}, 1995, pp. 79--84.

\bibitem{Bar-Cohen99}
Y.~Bar-Cohen, S.~Leary, M.~Shahinpoor, J.~O. Harrison, and J.~Smith, ``Flexible
  low-mass devices and mechanisms actuated by electroactive polymers,'' in
  \emph{Smart Structures and Materials 1999: Electroactive Polymer Actuators
  and Devices}, ser. Proceedings of {SPIE}, Y.~Bar-Cohen, Ed., vol. 3669.\hskip
  1em plus 0.5em minus 0.4em\relax Bellingham, WA: SPIE, 1999, pp. 51--56.

\bibitem{Tadokoro99}
S.~Tadokoro, S.~Yamagami, and M.~Ozawa, ``Soft micromanipulation device with
  multiple degrees of freedom consisting of high polymer gel actuators,'' in
  \emph{Proceedings of {IEEE} International Conference on Micro Electro
  Mechanical Systems}, 1999, pp. 37--42.

\bibitem{Lumia99}
R.~Lumia and M.~Shahinpoor, ``Microgripper design using electroactive
  polymers,'' \emph{Smart Structures and Materials 1999: Electroactive Polymer
  Actuators and Devices}, pp. 322--329, 1999.

\bibitem{Dosch92}
J.~Dosch, D.~Inman, and E.~Garcia, ``A self-sensing piezoelectric actuator for
  collocated control,'' \emph{Journal of Intelligent Material Systems and
  Structures}, vol.~3, pp. 166--185, 1992.

\bibitem{Bonomo03}
C.~Bonomo, C.~D. Negro, L.~Fortuna, S.~Graziani, and D.~Mazza,
  ``Characterization of {IPMC} strip sensorial properties: {P}reliminary
  results,'' in \emph{Proceedings of International Symposium on Circuits and
  Systems}, 2003, pp. IV--816--IV--819.

\bibitem{Farinholt04}
K.~Farinholt and D.~Leo, ``Modeling of electromechanical charge sensing in
  ionic polymer transducers,'' \emph{Mechanics of Materials}, vol.~36, pp.
  421--433, 2004.

\bibitem{Newbury02}
K.~M. Newbury, ``Characterization, modeling, and control of ionic polymer
  transducers,'' Ph.D. dissertation, Virginia Polytechnic Institute and State
  University, 2002.

\bibitem{Specialties98}
{Measurement Specialties}, \emph{Piezo Film Sensors Technical Manual}, Hampton,
  VA, 1998.

\bibitem{Lam99}
K.~Y. Lam and T.~Ng, ``Active control of composite plates with integrated
  piezoelectric sensors and actuators under various dynamic loading
  conditions,'' \emph{Smart Materials and Structures}, vol.~8, pp. 223--237,
  1999.

\bibitem{Lee03}
Y.-S. Lee, S.~J. Elliot, and P.~Gardonio, ``Matched piezoelectric double
  sensor/actuator pairs for beam motion control,'' \emph{Smart Materials and
  Structures}, vol.~12, pp. 541--548, 2003.

\bibitem{Wieschaus97}
E.~Wieschaus, ``From molecular patterns to morphogenesis: The lessons from
  {D}rosophila,'' in \emph{Nobel Lectures, Physiology or Medicine 1991-1995},
  N.~Ringertz, Ed.\hskip 1em plus 0.5em minus 0.4em\relax World Scientific
  Publishing Co., 1997.

\bibitem{Specialties99}
{Measurement Specialties}, \emph{Piezo Film Sensors Technical Manual}, Hampton,
  VA, 1999.

\bibitem{Bennett04}
M.~D. Bennett and D.~Leo, ``Ionic liquids as stable solvents for ionic polymer
  transducers,'' \emph{Sensors and Actuators A: Physical}, vol. 115, pp.
  79--90, 2004.

\bibitem{Shen04}
Y.~Shen, N.~Xi, U.~Wejinya, and W.~Li, ``High sensitivity {2-D} force sensor
  for assembly of surface {MEMS} devices,'' in \emph{Proceedings of {IEEE/RSJ}
  International Conference on Intelligent Robots and Systems}, Sendai, Japan,
  2004, pp. 3363--3368.

\bibitem{Gere97}
J.~M. Gere and S.~Timoshenko, \emph{Mechanics of Materials}, 4th~ed.\hskip 1em
  plus 0.5em minus 0.4em\relax Boston, MA: PWS Publishing Company, 1997.

\bibitem{Siripong06}
M.~Siripong, S.~Fredholm, Q.~Nguyen, B.~Shih, J.~Itescu, and J.~Stolk, ``A
  cost-effective fabrication method for ionic polymer-metal composites,'' in
  \emph{Electroresponsive Polymers and Their Applications}, ser. {MRS}
  Symposium Proceedings, V.~Bharti, Y.~Bar-Cohen, Z.~Cheng, Q.~Zhang, and
  J.~Madden, Eds., vol. 889, Warrendale, PA, 2006, pp. 0889--W04--03.

\bibitem{Sakakibara94}
T.~Sakakibara, H.~Izu, T.~Kura, W.~Shinohara, H.~Iwata, S.~Kiyama, and
  S.~Tsuda, ``Development of high-voltage photovoltaic micro-devices for an
  energy supply to micromachines,'' in \emph{Proceedings of {IEEE} 5th
  International Symposium on Micro Machine and Human Science}, Nagoya, Japan,
  1994, pp. 71--76.

\bibitem{Shen06}
Y.~Shen, U.~C. Wejinya, N.~Xi, M.~S. Buckley, C.~A. Pomeroy, and D.~N. Arhosti,
  ``Force measurement and mechanical characterization of living {Drosophila}
  embryos for human medecal study,'' \emph{Journal of Engineering in Medicine},
  2006, sumitted.

\bibitem{Astrom95}
K.~J. Astrom and B.~Wittenmark, \emph{Adaptive Control}, 2nd~ed.\hskip 1em plus
  0.5em minus 0.4em\relax Addison-Wesley, 1995.

\end{thebibliography}
