ObjectMon #92 MuonMonitor Slide Show

Run:176631 Event: 3318194 # of Events:67140 Time: Thu Dec 18 22:22:16 2003 Ref.Run:175155

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 200 400 600 800

Entries 35950

=0.97 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 200 400 600 800 1000

1200

Entries 35950

Mean -3.151

= 1.2 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

5000

Entries 35950 Mean 0.02578 RMS 9.049

= 1 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400 500 Entries 14273

= 1.3 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 500 1000

1500

2000

Entries 40888

Mean 0.0100

= 2.3 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800 1000

1200

Entries 14273 Mean -0.1046 RMS 13.43

= 1.4 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60 80 100

Entries 2115

= 1.4 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400 -200 0 200 400 0 50 100 150

Entries 2115 Mean -32.26

=0.77 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150

Entries 2115 Mean 1.035 RMS 20.06

= 2.1 (< 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

Run:176631 Event: 3318194 # of Events:67140 Time: Thu Dec 18 22:22:16 2003 Ref.Run:175155

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60

Entries 1784

= 2.6 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 50 100 150 200 250 300 Entries 1784

Mean -38.09

= 2.2 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80

Entries 1784 Mean -1.368 RMS 30.25

= 2.3 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 40888 Mean 2.121 RMS 1.619

= 2.2 (< 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

Run:176631 Event: 3318194 # of Events:67140 Time: Thu Dec 18 22:22:16 2003 Ref.Run:175155

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 200

400 600

Entries 35950 Mean 177 RMS 103.5

= 1.2 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 500 1000

1500

2000

Entries 35950 Mean -0.004099 RMS 0.3605

= 1.4 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

5000

Entries 35950 Mean 0.02578 RMS 9.049

= 1 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400

Entries 14273 Mean 176.7 RMS 103.3

= 1.1 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 200 400 600 800 1000

Entries 14273 Mean -0.0008195 RMS 0.3125

= 1.4 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800 1000

1200

Entries 14273 Mean -0.1046 RMS 13.43

= 1.4 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30 40 50 60

Entries 2115 Mean 173.2 RMS 102.9

= 1.9 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0

50

100

150

Entries 2115 Mean -0.05704 RMS 0.836

= 1.6 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150

Entries 2115 Mean 1.035 RMS 20.06

= 2.1 (< 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

Run:176631 Event: 3318194 # of Events:67140 Time: Thu Dec 18 22:22:16 2003 Ref.Run:175155

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 40888 Mean 2.121 RMS 1.619

= 2.2 (< 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 67140 Mean 0.6085 RMS 0.8875

=3.3e+03 (> 3) 2χ Number of Muons