Backgrounds

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 200 400 600 800 Wjj S_T dm180

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 200 400 600 800 QCD S_T dm180

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 200 400 600 800 TopLJ S_T dm180

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 200 400 600 800 TopLL S_T dm180

Signals

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 200 400 600 800 LQ MC 160 GeV/c^2 S_T dm180

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 200 400 600 800 LQ MC 180 GeV/c^2 S_T dm180

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 200 400 600 800 LQ MC 200 GeV/c^2 S_T dm180

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 200 400 600 800 LQ MC 220 GeV/c^2 S_T dm180

Data (a+b+c)

0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1

0 100 200 300 400 500 600 700 800 Data S_T dm180

Comparing HBOOK and NN

0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1

0 100 200 300 400 500 600 700 800 s/(s+b) (HBOOK) S_T dm180